---
title: NA2XS(FL)2Y
sku: NA2XS(FL)2Y-medium-voltage-cables
slug: na2xsfl2y-mv
description: >
  Das NA2XS(FL)2Y Kabel ist ein längswasserdichtes Mittelspannungskabel mit
  Aluminiumleiter, VPE-Isolation und einem kombinierten Alu-/PE-Mantel. Es wurde
  speziell für Versorgungsnetze entwickelt, bei denen hohe mechanische
  Belastbarkeit und Schutz gegen Wassereintritt gefordert sind.
categories:
  - id: 699de42dad0808777d11a2ac
    category: Mittelspannungskabel
featuredImage:
  id: 30
  alt: NA2XSFL2Y 3 scaled
  caption: null
  updatedAt: '2026-02-24T17:47:25.432Z'
  createdAt: '2026-02-24T17:47:25.432Z'
  url: /media/NA2XSFL2Y-3-scaled-7.webp
  thumbnailURL: /media/NA2XSFL2Y-3-scaled-7-600x125.webp
  filename: NA2XSFL2Y-3-scaled-7.webp
  mimeType: image/webp
  filesize: 43276
  width: 2560
  height: 533
  focalX: 50
  focalY: 50
  sizes:
    thumbnail:
      url: /media/NA2XSFL2Y-3-scaled-7-600x125.webp
      width: 600
      height: 125
      mimeType: image/webp
      filesize: 6292
      filename: NA2XSFL2Y-3-scaled-7-600x125.webp
    card:
      url: /media/NA2XSFL2Y-3-scaled-7-768x160.webp
      width: 768
      height: 160
      mimeType: image/webp
      filesize: 8170
      filename: NA2XSFL2Y-3-scaled-7-768x160.webp
    tablet:
      url: /media/NA2XSFL2Y-3-scaled-7-1024x213.webp
      width: 1024
      height: 213
      mimeType: image/webp
      filesize: 11370
      filename: NA2XSFL2Y-3-scaled-7-1024x213.webp
images:
  - id: 30
    alt: NA2XSFL2Y 3 scaled
    caption: null
    updatedAt: '2026-02-24T17:47:25.432Z'
    createdAt: '2026-02-24T17:47:25.432Z'
    url: /media/NA2XSFL2Y-3-scaled-7.webp
    thumbnailURL: /media/NA2XSFL2Y-3-scaled-7-600x125.webp
    filename: NA2XSFL2Y-3-scaled-7.webp
    mimeType: image/webp
    filesize: 43276
    width: 2560
    height: 533
    focalX: 50
    focalY: 50
    sizes:
      thumbnail:
        url: /media/NA2XSFL2Y-3-scaled-7-600x125.webp
        width: 600
        height: 125
        mimeType: image/webp
        filesize: 6292
        filename: NA2XSFL2Y-3-scaled-7-600x125.webp
      card:
        url: /media/NA2XSFL2Y-3-scaled-7-768x160.webp
        width: 768
        height: 160
        mimeType: image/webp
        filesize: 8170
        filename: NA2XSFL2Y-3-scaled-7-768x160.webp
      tablet:
        url: /media/NA2XSFL2Y-3-scaled-7-1024x213.webp
        width: 1024
        height: 213
        mimeType: image/webp
        filesize: 11370
        filename: NA2XSFL2Y-3-scaled-7-1024x213.webp
application:
  root:
    type: root
    format: ''
    indent: 0
    version: 1
    children:
      - type: paragraph
        format: ''
        indent: 0
        version: 1
        children:
          - mode: normal
            text: >-
              Das NA2XS(FL)2Y erfüllt die Normen DIN VDE 0276-620, HD 620 S2 und
              IEC 60502. Es ist ideal für die Verlegung in
              Energieversorgungsnetzen (EVU), Innenräumen, Kabelkanälen, im
              Freien, in Erde und in Wasser geeignet. Dank seiner Konstruktion
              mit längswasserdichter Ausführung und Alu-PE-Schichtenmantel
              bleibt es auch bei Beschädigungen betriebssicher – der
              Wassereinfluss wird gezielt auf die Schadstelle begrenzt.
            type: text
            style: ''
            detail: 0
            format: 0
            version: 1
        direction: ltr
    direction: ltr
_status: published
---

#### Entwickelt für den Einsatz in Energieversorgungsnetzen

Das **NA2XS(FL)2Y** erfüllt die Normen **DIN VDE 0276-620**, **HD 620 S2** und **IEC 60502**. Es ist ideal für die Verlegung in **Energieversorgungsnetzen (EVU), Innenräumen, Kabelkanälen, im Freien, in Erde und in Wasser** geeignet. Dank seiner Konstruktion mit längswasserdichter Ausführung und Alu-PE-Schichtenmantel bleibt es auch bei Beschädigungen betriebssicher – der Wassereinfluss wird gezielt auf die Schadstelle begrenzt.

#### Technischer Aufbau

Das Kabel besitzt einen **mehrdrähtigen Aluminiumleiter** (Kl. 2 nach VDE 0295 / IEC 60228), umgeben von einer **VPE-Isolierung** mit **festhaftender äußerer Leitschicht**. Eine **leitfähige, längswasserdichte Bandierung** sowie eine **Kupferdraht-Abschirmung mit Querleitwendel** sorgen für zuverlässige Feldsteuerung. Zusätzlich ist das Kabel mit einer **längswasserdichten Aluminiumbandierung** ausgestattet, die **fest mit dem schwarzen PE-Mantel** verschweißt ist. Das Ergebnis: hoher Schutz vor mechanischer Belastung und eindringender Feuchtigkeit.

#### Eigenschaften und Anwendung

Das NA2XS(FL)2Y Kabel ist **erdverlegbar**, **silikon- und cadmiumfrei** und eignet sich für Umgebungen mit hoher mechanischer Beanspruchung. Es hält **Temperaturen bis +90 °C im Betrieb** und **bis +250 °C im Kurzschlussfall** stand. Dank teilentladungsfreiem Aufbau und Querwassersperre ist es besonders gut für **kritische Versorgungsbereiche** in der Energieinfrastruktur geeignet.

<Block type="productTabs" data={{"blockType":"productTabs","voltageTables":[{"id":"699de42dad0808777d11a38f","rows":[{"id":"699de42dad0808777d11a2d8","cells":[{"id":"699de42dad0808777d11a2cb","value":"Al"},{"id":"699de42dad0808777d11a2cc","value":"RM"},{"id":"699de42dad0808777d11a2cd","value":"0,22"},{"id":"699de42dad0808777d11a2ce","value":"15,3"},{"id":"699de42dad0808777d11a2cf","value":"0,868"},{"id":"699de42dad0808777d11a2d0","value":"3,4"},{"id":"699de42dad0808777d11a2d1","value":"160"},{"id":"699de42dad0808777d11a2d2","value":"145"},{"id":"699de42dad0808777d11a2d3","value":"3,3"},{"id":"699de42dad0808777d11a2d4","value":"2,1"},{"id":"699de42dad0808777d11a2d5","value":"500"},{"id":"699de42dad0808777d11a2d6","value":"25"},{"id":"699de42dad0808777d11a2d7","value":"643"}],"configuration":"1x35/16"},{"id":"699de42dad0808777d11a2e6","cells":[{"id":"699de42dad0808777d11a2d9","value":"Al"},{"id":"699de42dad0808777d11a2da","value":"RM"},{"id":"699de42dad0808777d11a2db","value":"0,25"},{"id":"699de42dad0808777d11a2dc","value":"16,4"},{"id":"699de42dad0808777d11a2dd","value":"0,641"},{"id":"699de42dad0808777d11a2de","value":"3,4"},{"id":"699de42dad0808777d11a2df","value":"183"},{"id":"699de42dad0808777d11a2e0","value":"171"},{"id":"699de42dad0808777d11a2e1","value":"4,7"},{"id":"699de42dad0808777d11a2e2","value":"2,1"},{"id":"699de42dad0808777d11a2e3","value":"520"},{"id":"699de42dad0808777d11a2e4","value":"26"},{"id":"699de42dad0808777d11a2e5","value":"712"}],"configuration":"1x50/16"},{"id":"699de42dad0808777d11a2f4","cells":[{"id":"699de42dad0808777d11a2e7","value":"Al"},{"id":"699de42dad0808777d11a2e8","value":"RM"},{"id":"699de42dad0808777d11a2e9","value":"0,28"},{"id":"699de42dad0808777d11a2ea","value":"17,9"},{"id":"699de42dad0808777d11a2eb","value":"0,443"},{"id":"699de42dad0808777d11a2ec","value":"3,4"},{"id":"699de42dad0808777d11a2ed","value":"228"},{"id":"699de42dad0808777d11a2ee","value":"208"},{"id":"699de42dad0808777d11a2ef","value":"6,6"},{"id":"699de42dad0808777d11a2f0","value":"2,1"},{"id":"699de42dad0808777d11a2f1","value":"405"},{"id":"699de42dad0808777d11a2f2","value":"27"},{"id":"699de42dad0808777d11a2f3","value":"796"}],"configuration":"1x70/16"},{"id":"699de42dad0808777d11a302","cells":[{"id":"699de42dad0808777d11a2f5","value":"Al"},{"id":"699de42dad0808777d11a2f6","value":"RM"},{"id":"699de42dad0808777d11a2f7","value":"0,31"},{"id":"699de42dad0808777d11a2f8","value":"19,4"},{"id":"699de42dad0808777d11a2f9","value":"0,32"},{"id":"699de42dad0808777d11a2fa","value":"3,4"},{"id":"699de42dad0808777d11a2fb","value":"278"},{"id":"699de42dad0808777d11a2fc","value":"248"},{"id":"699de42dad0808777d11a2fd","value":"9"},{"id":"699de42dad0808777d11a2fe","value":"2,1"},{"id":"699de42dad0808777d11a2ff","value":"580"},{"id":"699de42dad0808777d11a300","value":"29"},{"id":"699de42dad0808777d11a301","value":"902"}],"configuration":"1x95/16"},{"id":"699de42dad0808777d11a310","cells":[{"id":"699de42dad0808777d11a303","value":"Al"},{"id":"699de42dad0808777d11a304","value":"RM"},{"id":"699de42dad0808777d11a305","value":"0,34"},{"id":"699de42dad0808777d11a306","value":"20,9"},{"id":"699de42dad0808777d11a307","value":"0,253"},{"id":"699de42dad0808777d11a308","value":"3,4"},{"id":"699de42dad0808777d11a309","value":"321"},{"id":"699de42dad0808777d11a30a","value":"283"},{"id":"699de42dad0808777d11a30b","value":"11,3"},{"id":"699de42dad0808777d11a30c","value":"2,1"},{"id":"699de42dad0808777d11a30d","value":"600"},{"id":"699de42dad0808777d11a30e","value":"30"},{"id":"699de42dad0808777d11a30f","value":"1009"}],"configuration":"1x120/16"},{"id":"699de42dad0808777d11a31e","cells":[{"id":"699de42dad0808777d11a311","value":"Al"},{"id":"699de42dad0808777d11a312","value":"RM"},{"id":"699de42dad0808777d11a313","value":"0,36"},{"id":"699de42dad0808777d11a314","value":"22,3"},{"id":"699de42dad0808777d11a315","value":"0,206"},{"id":"699de42dad0808777d11a316","value":"3,4"},{"id":"699de42dad0808777d11a317","value":"364"},{"id":"699de42dad0808777d11a318","value":"315"},{"id":"699de42dad0808777d11a319","value":"14,2"},{"id":"699de42dad0808777d11a31a","value":"2,1"},{"id":"699de42dad0808777d11a31b","value":"640"},{"id":"699de42dad0808777d11a31c","value":"32"},{"id":"699de42dad0808777d11a31d","value":"1193"}],"configuration":"1x150/25"},{"id":"699de42dad0808777d11a32c","cells":[{"id":"699de42dad0808777d11a31f","value":"Al"},{"id":"699de42dad0808777d11a320","value":"RM"},{"id":"699de42dad0808777d11a321","value":"0,4"},{"id":"699de42dad0808777d11a322","value":"23,9"},{"id":"699de42dad0808777d11a323","value":"0,164"},{"id":"699de42dad0808777d11a324","value":"3,4"},{"id":"699de42dad0808777d11a325","value":"418"},{"id":"699de42dad0808777d11a326","value":"357"},{"id":"699de42dad0808777d11a327","value":"17,5"},{"id":"699de42dad0808777d11a328","value":"2,1"},{"id":"699de42dad0808777d11a329","value":"660"},{"id":"699de42dad0808777d11a32a","value":"33"},{"id":"699de42dad0808777d11a32b","value":"1341"}],"configuration":"1x185/25"},{"id":"699de42dad0808777d11a33a","cells":[{"id":"699de42dad0808777d11a32d","value":"Al"},{"id":"699de42dad0808777d11a32e","value":"RM"},{"id":"699de42dad0808777d11a32f","value":"0,44"},{"id":"699de42dad0808777d11a330","value":"26,2"},{"id":"699de42dad0808777d11a331","value":"0,125"},{"id":"699de42dad0808777d11a332","value":"3,4"},{"id":"699de42dad0808777d11a333","value":"494"},{"id":"699de42dad0808777d11a334","value":"413"},{"id":"699de42dad0808777d11a335","value":"22,7"},{"id":"699de42dad0808777d11a336","value":"2,1"},{"id":"699de42dad0808777d11a337","value":"720"},{"id":"699de42dad0808777d11a338","value":"36"},{"id":"699de42dad0808777d11a339","value":"1546"}],"configuration":"1x240/25"},{"id":"699de42dad0808777d11a348","cells":[{"id":"699de42dad0808777d11a33b","value":"Al"},{"id":"699de42dad0808777d11a33c","value":"RM"},{"id":"699de42dad0808777d11a33d","value":"0,48"},{"id":"699de42dad0808777d11a33e","value":"28,3"},{"id":"699de42dad0808777d11a33f","value":"0,1"},{"id":"699de42dad0808777d11a340","value":"3,4"},{"id":"699de42dad0808777d11a341","value":"568"},{"id":"699de42dad0808777d11a342","value":"466"},{"id":"699de42dad0808777d11a343","value":"28,4"},{"id":"699de42dad0808777d11a344","value":"2,1"},{"id":"699de42dad0808777d11a345","value":"760"},{"id":"699de42dad0808777d11a346","value":"38"},{"id":"699de42dad0808777d11a347","value":"1797"}],"configuration":"1x300/25"},{"id":"699de42dad0808777d11a356","cells":[{"id":"699de42dad0808777d11a349","value":"Al"},{"id":"699de42dad0808777d11a34a","value":"RM"},{"id":"699de42dad0808777d11a34b","value":"0,54"},{"id":"699de42dad0808777d11a34c","value":"31,4"},{"id":"699de42dad0808777d11a34d","value":"0,0778"},{"id":"699de42dad0808777d11a34e","value":"3,4"},{"id":"699de42dad0808777d11a34f","value":"660"},{"id":"699de42dad0808777d11a350","value":"529"},{"id":"699de42dad0808777d11a351","value":"37,8"},{"id":"699de42dad0808777d11a352","value":"2,1"},{"id":"699de42dad0808777d11a353","value":"820"},{"id":"699de42dad0808777d11a354","value":"41"},{"id":"699de42dad0808777d11a355","value":"2222"}],"configuration":"1x400/35"},{"id":"699de42dad0808777d11a364","cells":[{"id":"699de42dad0808777d11a357","value":"Al"},{"id":"699de42dad0808777d11a358","value":"RM"},{"id":"699de42dad0808777d11a359","value":"0,61"},{"id":"699de42dad0808777d11a35a","value":"34,6"},{"id":"699de42dad0808777d11a35b","value":"0,0605"},{"id":"699de42dad0808777d11a35c","value":"3,4"},{"id":"699de42dad0808777d11a35d","value":"767"},{"id":"699de42dad0808777d11a35e","value":"602"},{"id":"699de42dad0808777d11a35f","value":"47,3"},{"id":"699de42dad0808777d11a360","value":"2,1"},{"id":"699de42dad0808777d11a361","value":"880"},{"id":"699de42dad0808777d11a362","value":"44"},{"id":"699de42dad0808777d11a363","value":"2599"}],"configuration":"1x500/35"},{"id":"699de42dad0808777d11a372","cells":[{"id":"699de42dad0808777d11a365","value":"Al"},{"id":"699de42dad0808777d11a366","value":"RM"},{"id":"699de42dad0808777d11a367","value":"0,67"},{"id":"699de42dad0808777d11a368","value":"38"},{"id":"699de42dad0808777d11a369","value":"0,0469"},{"id":"699de42dad0808777d11a36a","value":"3,4"},{"id":"699de42dad0808777d11a36b","value":"861"},{"id":"699de42dad0808777d11a36c","value":"690"},{"id":"699de42dad0808777d11a36d","value":"59,6"},{"id":"699de42dad0808777d11a36e","value":"2,1"},{"id":"699de42dad0808777d11a36f","value":"940"},{"id":"699de42dad0808777d11a370","value":"47"},{"id":"699de42dad0808777d11a371","value":"3062"}],"configuration":"1x630/35"},{"id":"699de42dad0808777d11a380","cells":[{"id":"699de42dad0808777d11a373","value":"Al"},{"id":"699de42dad0808777d11a374","value":"RM"},{"id":"699de42dad0808777d11a375","value":"0,76"},{"id":"699de42dad0808777d11a376","value":"42,3"},{"id":"699de42dad0808777d11a377","value":"0,0367"},{"id":"699de42dad0808777d11a378","value":"3,4"},{"id":"699de42dad0808777d11a379","value":"976"},{"id":"699de42dad0808777d11a37a","value":"764"},{"id":"699de42dad0808777d11a37b","value":"75,6"},{"id":"699de42dad0808777d11a37c","value":"2,4"},{"id":"699de42dad0808777d11a37d","value":"1040"},{"id":"699de42dad0808777d11a37e","value":"52"},{"id":"699de42dad0808777d11a37f","value":"3686"}],"configuration":"1x800/35"},{"id":"699de42dad0808777d11a38e","cells":[{"id":"699de42dad0808777d11a381","value":"Al"},{"id":"699de42dad0808777d11a382","value":"RM"},{"id":"699de42dad0808777d11a383","value":"0,84"},{"id":"699de42dad0808777d11a384","value":"46,2"},{"id":"699de42dad0808777d11a385","value":"0,0291"},{"id":"699de42dad0808777d11a386","value":"3,4"},{"id":"699de42dad0808777d11a387","value":"1187"},{"id":"699de42dad0808777d11a388","value":"852"},{"id":"699de42dad0808777d11a389","value":"94"},{"id":"699de42dad0808777d11a38a","value":"2,4"},{"id":"699de42dad0808777d11a38b","value":"1120"},{"id":"699de42dad0808777d11a38c","value":"56"},{"id":"699de42dad0808777d11a38d","value":"4372"}],"configuration":"1x1000/35"}],"columns":[{"id":"699de42dad0808777d11a2be","key":"Cond","label":"Leiter"},{"id":"699de42dad0808777d11a2bf","key":"shape","label":"Form"},{"id":"699de42dad0808777d11a2c0","key":"cap","label":"Cap [uF/km]"},{"id":"699de42dad0808777d11a2c1","key":"DI","label":"DI [mm]"},{"id":"699de42dad0808777d11a2c2","key":"RI","label":"RI [Ohm/km]"},{"id":"699de42dad0808777d11a2c3","key":"Wi","label":"Wi [mm]"},{"id":"699de42dad0808777d11a2c4","key":"Ibl","label":"Ibl [A]"},{"id":"699de42dad0808777d11a2c5","key":"Ibe","label":"Ibe [A]"},{"id":"699de42dad0808777d11a2c6","key":"Ik_cond","label":"Ik [kA]"},{"id":"699de42dad0808777d11a2c7","key":"Wm","label":"Wm [mm]"},{"id":"699de42dad0808777d11a2c8","key":"Rbv","label":"Rbv [mm]"},{"id":"699de42dad0808777d11a2c9","key":"Ø","label":"Ø [mm]"},{"id":"699de42dad0808777d11a2ca","key":"G","label":"G [kg/km]"}],"metaItems":[{"id":"699de42dad0808777d11a2b5","label":"Spannung","value":"6/10 kV"},{"id":"699de42dad0808777d11a2b6","unit":"kV","label":"Prüfspannung","value":"21"},{"id":"699de42dad0808777d11a2b7","unit":"°C","label":"Temperaturbereich","value":"-35-+90"},{"id":"699de42dad0808777d11a2b8","unit":"°C","label":"Leitertemperatur (max.)","value":"+90"},{"id":"699de42dad0808777d11a2b9","unit":"°C","label":"Kurzschlusstemperatur (max.)","value":"+250"},{"id":"699de42dad0808777d11a2ba","unit":"°C","label":"Minimale Verlegetemperatur","value":"-20"},{"id":"699de42dad0808777d11a2bb","unit":"°C","label":"Minimale Lagertemperatur","value":"-35"},{"id":"699de42dad0808777d11a2bc","unit":"","label":"CPR-Klasse","value":"Fca"},{"id":"699de42dad0808777d11a2bd","unit":"","label":"Flammhemmend","value":"no"}],"voltageLabel":"6/10 kV"},{"id":"699de42dad0808777d11a46a","rows":[{"id":"699de42dad0808777d11a3b3","cells":[{"id":"699de42dad0808777d11a3a6","value":"Al"},{"id":"699de42dad0808777d11a3a7","value":"RM"},{"id":"699de42dad0808777d11a3a8","value":"0,17"},{"id":"699de42dad0808777d11a3a9","value":"20,6"},{"id":"699de42dad0808777d11a3aa","value":"0,641"},{"id":"699de42dad0808777d11a3ab","value":"5,5"},{"id":"699de42dad0808777d11a3ac","value":"185"},{"id":"699de42dad0808777d11a3ad","value":"172"},{"id":"699de42dad0808777d11a3ae","value":"4,7"},{"id":"699de42dad0808777d11a3af","value":"2,1"},{"id":"699de42dad0808777d11a3b0","value":"600"},{"id":"699de42dad0808777d11a3b1","value":"30"},{"id":"699de42dad0808777d11a3b2","value":"876"}],"configuration":"1x50/16"},{"id":"699de42dad0808777d11a3c1","cells":[{"id":"699de42dad0808777d11a3b4","value":"Al"},{"id":"699de42dad0808777d11a3b5","value":"RM"},{"id":"699de42dad0808777d11a3b6","value":"0,19"},{"id":"699de42dad0808777d11a3b7","value":"22,1"},{"id":"699de42dad0808777d11a3b8","value":"0,443"},{"id":"699de42dad0808777d11a3b9","value":"5,5"},{"id":"699de42dad0808777d11a3ba","value":"231"},{"id":"699de42dad0808777d11a3bb","value":"210"},{"id":"699de42dad0808777d11a3bc","value":"6,6"},{"id":"699de42dad0808777d11a3bd","value":"2,1"},{"id":"699de42dad0808777d11a3be","value":"640"},{"id":"699de42dad0808777d11a3bf","value":"32"},{"id":"699de42dad0808777d11a3c0","value":"982"}],"configuration":"1x70/16"},{"id":"699de42dad0808777d11a3cf","cells":[{"id":"699de42dad0808777d11a3c2","value":"Al"},{"id":"699de42dad0808777d11a3c3","value":"RM"},{"id":"699de42dad0808777d11a3c4","value":"0,21"},{"id":"699de42dad0808777d11a3c5","value":"23,6"},{"id":"699de42dad0808777d11a3c6","value":"0,32"},{"id":"699de42dad0808777d11a3c7","value":"5,5"},{"id":"699de42dad0808777d11a3c8","value":"280"},{"id":"699de42dad0808777d11a3c9","value":"251"},{"id":"699de42dad0808777d11a3ca","value":"9"},{"id":"699de42dad0808777d11a3cb","value":"2,1"},{"id":"699de42dad0808777d11a3cc","value":"660"},{"id":"699de42dad0808777d11a3cd","value":"33"},{"id":"699de42dad0808777d11a3ce","value":"1101"}],"configuration":"1x95/16"},{"id":"699de42dad0808777d11a3dd","cells":[{"id":"699de42dad0808777d11a3d0","value":"Al"},{"id":"699de42dad0808777d11a3d1","value":"RM"},{"id":"699de42dad0808777d11a3d2","value":"0,23"},{"id":"699de42dad0808777d11a3d3","value":"25,1"},{"id":"699de42dad0808777d11a3d4","value":"0,253"},{"id":"699de42dad0808777d11a3d5","value":"5,5"},{"id":"699de42dad0808777d11a3d6","value":"323"},{"id":"699de42dad0808777d11a3d7","value":"285"},{"id":"699de42dad0808777d11a3d8","value":"11,3"},{"id":"699de42dad0808777d11a3d9","value":"2,1"},{"id":"699de42dad0808777d11a3da","value":"700"},{"id":"699de42dad0808777d11a3db","value":"35"},{"id":"699de42dad0808777d11a3dc","value":"1217"}],"configuration":"1x120/16"},{"id":"699de42dad0808777d11a3eb","cells":[{"id":"699de42dad0808777d11a3de","value":"Al"},{"id":"699de42dad0808777d11a3df","value":"RM"},{"id":"699de42dad0808777d11a3e0","value":"0,25"},{"id":"699de42dad0808777d11a3e1","value":"26,5"},{"id":"699de42dad0808777d11a3e2","value":"0,206"},{"id":"699de42dad0808777d11a3e3","value":"5,5"},{"id":"699de42dad0808777d11a3e4","value":"366"},{"id":"699de42dad0808777d11a3e5","value":"319"},{"id":"699de42dad0808777d11a3e6","value":"14,2"},{"id":"699de42dad0808777d11a3e7","value":"2,1"},{"id":"699de42dad0808777d11a3e8","value":"720"},{"id":"699de42dad0808777d11a3e9","value":"36"},{"id":"699de42dad0808777d11a3ea","value":"1412"}],"configuration":"1x150/25"},{"id":"699de42dad0808777d11a3f9","cells":[{"id":"699de42dad0808777d11a3ec","value":"Al"},{"id":"699de42dad0808777d11a3ed","value":"RM"},{"id":"699de42dad0808777d11a3ee","value":"0,27"},{"id":"699de42dad0808777d11a3ef","value":"28,1"},{"id":"699de42dad0808777d11a3f0","value":"0,164"},{"id":"699de42dad0808777d11a3f1","value":"5,5"},{"id":"699de42dad0808777d11a3f2","value":"420"},{"id":"699de42dad0808777d11a3f3","value":"361"},{"id":"699de42dad0808777d11a3f4","value":"17,5"},{"id":"699de42dad0808777d11a3f5","value":"2,1"},{"id":"699de42dad0808777d11a3f6","value":"760"},{"id":"699de42dad0808777d11a3f7","value":"38"},{"id":"699de42dad0808777d11a3f8","value":"1568"}],"configuration":"1x185/25"},{"id":"699de42dad0808777d11a407","cells":[{"id":"699de42dad0808777d11a3fa","value":"Al"},{"id":"699de42dad0808777d11a3fb","value":"RM"},{"id":"699de42dad0808777d11a3fc","value":"0,3"},{"id":"699de42dad0808777d11a3fd","value":"30,4"},{"id":"699de42dad0808777d11a3fe","value":"0,125"},{"id":"699de42dad0808777d11a3ff","value":"5,5"},{"id":"699de42dad0808777d11a400","value":"496"},{"id":"699de42dad0808777d11a401","value":"417"},{"id":"699de42dad0808777d11a402","value":"22,7"},{"id":"699de42dad0808777d11a403","value":"2,1"},{"id":"699de42dad0808777d11a404","value":"800"},{"id":"699de42dad0808777d11a405","value":"40"},{"id":"699de42dad0808777d11a406","value":"1792"}],"configuration":"1x240/25"},{"id":"699de42dad0808777d11a415","cells":[{"id":"699de42dad0808777d11a408","value":"Al"},{"id":"699de42dad0808777d11a409","value":"RM"},{"id":"699de42dad0808777d11a40a","value":"0,32"},{"id":"699de42dad0808777d11a40b","value":"32,5"},{"id":"699de42dad0808777d11a40c","value":"0,1"},{"id":"699de42dad0808777d11a40d","value":"5,5"},{"id":"699de42dad0808777d11a40e","value":"569"},{"id":"699de42dad0808777d11a40f","value":"471"},{"id":"699de42dad0808777d11a410","value":"28,4"},{"id":"699de42dad0808777d11a411","value":"2,1"},{"id":"699de42dad0808777d11a412","value":"840"},{"id":"699de42dad0808777d11a413","value":"42"},{"id":"699de42dad0808777d11a414","value":"2020"}],"configuration":"1x300/25"},{"id":"699de42dad0808777d11a423","cells":[{"id":"699de42dad0808777d11a416","value":"Al"},{"id":"699de42dad0808777d11a417","value":"RM"},{"id":"699de42dad0808777d11a418","value":"0,36"},{"id":"699de42dad0808777d11a419","value":"35,6"},{"id":"699de42dad0808777d11a41a","value":"0,078"},{"id":"699de42dad0808777d11a41b","value":"5,5"},{"id":"699de42dad0808777d11a41c","value":"660"},{"id":"699de42dad0808777d11a41d","value":"535"},{"id":"699de42dad0808777d11a41e","value":"37,8"},{"id":"699de42dad0808777d11a41f","value":"2,1"},{"id":"699de42dad0808777d11a420","value":"900"},{"id":"699de42dad0808777d11a421","value":"45"},{"id":"699de42dad0808777d11a422","value":"2493"}],"configuration":"1x400/35"},{"id":"699de42dad0808777d11a431","cells":[{"id":"699de42dad0808777d11a424","value":"Al"},{"id":"699de42dad0808777d11a425","value":"RM"},{"id":"699de42dad0808777d11a426","value":"0,4"},{"id":"699de42dad0808777d11a427","value":"38,8"},{"id":"699de42dad0808777d11a428","value":"0,061"},{"id":"699de42dad0808777d11a429","value":"5,5"},{"id":"699de42dad0808777d11a42a","value":"766"},{"id":"699de42dad0808777d11a42b","value":"609"},{"id":"699de42dad0808777d11a42c","value":"47,3"},{"id":"699de42dad0808777d11a42d","value":"2,1"},{"id":"699de42dad0808777d11a42e","value":"980"},{"id":"699de42dad0808777d11a42f","value":"49"},{"id":"699de42dad0808777d11a430","value":"2903"}],"configuration":"1x500/35"},{"id":"699de42dad0808777d11a43f","cells":[{"id":"699de42dad0808777d11a432","value":"Al"},{"id":"699de42dad0808777d11a433","value":"RM"},{"id":"699de42dad0808777d11a434","value":"0,4"},{"id":"699de42dad0808777d11a435","value":"38,8"},{"id":"699de42dad0808777d11a436","value":"0,061"},{"id":"699de42dad0808777d11a437","value":"5,5"},{"id":"699de42dad0808777d11a438","value":"766"},{"id":"699de42dad0808777d11a439","value":"609"},{"id":"699de42dad0808777d11a43a","value":"47,3"},{"id":"699de42dad0808777d11a43b","value":"2,1"},{"id":"699de42dad0808777d11a43c","value":"980"},{"id":"699de42dad0808777d11a43d","value":"49"},{"id":"699de42dad0808777d11a43e","value":"3059"}],"configuration":"1x500/50"},{"id":"699de42dad0808777d11a44d","cells":[{"id":"699de42dad0808777d11a440","value":"Al"},{"id":"699de42dad0808777d11a441","value":"RM"},{"id":"699de42dad0808777d11a442","value":"0,44"},{"id":"699de42dad0808777d11a443","value":"42,2"},{"id":"699de42dad0808777d11a444","value":"0,047"},{"id":"699de42dad0808777d11a445","value":"5,5"},{"id":"699de42dad0808777d11a446","value":"866"},{"id":"699de42dad0808777d11a447","value":"705"},{"id":"699de42dad0808777d11a448","value":"59,6"},{"id":"699de42dad0808777d11a449","value":"2,4"},{"id":"699de42dad0808777d11a44a","value":"780"},{"id":"699de42dad0808777d11a44b","value":"52"},{"id":"699de42dad0808777d11a44c","value":"3383"}],"configuration":"1x630/35"},{"id":"699de42dad0808777d11a45b","cells":[{"id":"699de42dad0808777d11a44e","value":"Al"},{"id":"699de42dad0808777d11a44f","value":"RM"},{"id":"699de42dad0808777d11a450","value":"0,49"},{"id":"699de42dad0808777d11a451","value":"46,5"},{"id":"699de42dad0808777d11a452","value":"0,037"},{"id":"699de42dad0808777d11a453","value":"5,5"},{"id":"699de42dad0808777d11a454","value":"984"},{"id":"699de42dad0808777d11a455","value":"767"},{"id":"699de42dad0808777d11a456","value":"75,6"},{"id":"699de42dad0808777d11a457","value":"2,4"},{"id":"699de42dad0808777d11a458","value":"840"},{"id":"699de42dad0808777d11a459","value":"56"},{"id":"699de42dad0808777d11a45a","value":"3858"}],"configuration":"1x800/35"},{"id":"699de42dad0808777d11a469","cells":[{"id":"699de42dad0808777d11a45c","value":"Al"},{"id":"699de42dad0808777d11a45d","value":"RM"},{"id":"699de42dad0808777d11a45e","value":"0,55"},{"id":"699de42dad0808777d11a45f","value":"50,4"},{"id":"699de42dad0808777d11a460","value":"0,0291"},{"id":"699de42dad0808777d11a461","value":"5,5"},{"id":"699de42dad0808777d11a462","value":"1187"},{"id":"699de42dad0808777d11a463","value":"863"},{"id":"699de42dad0808777d11a464","value":"94"},{"id":"699de42dad0808777d11a465","value":"2,4"},{"id":"699de42dad0808777d11a466","value":"1220"},{"id":"699de42dad0808777d11a467","value":"61"},{"id":"699de42dad0808777d11a468","value":"4824"}],"configuration":"1x1000/35"}],"columns":[{"id":"699de42dad0808777d11a399","key":"Cond","label":"Leiter"},{"id":"699de42dad0808777d11a39a","key":"shape","label":"Form"},{"id":"699de42dad0808777d11a39b","key":"cap","label":"Cap [uF/km]"},{"id":"699de42dad0808777d11a39c","key":"DI","label":"DI [mm]"},{"id":"699de42dad0808777d11a39d","key":"RI","label":"RI [Ohm/km]"},{"id":"699de42dad0808777d11a39e","key":"Wi","label":"Wi [mm]"},{"id":"699de42dad0808777d11a39f","key":"Ibl","label":"Ibl [A]"},{"id":"699de42dad0808777d11a3a0","key":"Ibe","label":"Ibe [A]"},{"id":"699de42dad0808777d11a3a1","key":"Ik_cond","label":"Ik [kA]"},{"id":"699de42dad0808777d11a3a2","key":"Wm","label":"Wm [mm]"},{"id":"699de42dad0808777d11a3a3","key":"Rbv","label":"Rbv [mm]"},{"id":"699de42dad0808777d11a3a4","key":"Ø","label":"Ø [mm]"},{"id":"699de42dad0808777d11a3a5","key":"G","label":"G [kg/km]"}],"metaItems":[{"id":"699de42dad0808777d11a390","label":"Spannung","value":"12/20 kV"},{"id":"699de42dad0808777d11a391","unit":"kV","label":"Prüfspannung","value":"42"},{"id":"699de42dad0808777d11a392","unit":"°C","label":"Temperaturbereich","value":"-35-+90"},{"id":"699de42dad0808777d11a393","unit":"°C","label":"Leitertemperatur (max.)","value":"+90"},{"id":"699de42dad0808777d11a394","unit":"°C","label":"Kurzschlusstemperatur (max.)","value":"+250"},{"id":"699de42dad0808777d11a395","unit":"°C","label":"Minimale Verlegetemperatur","value":"-20"},{"id":"699de42dad0808777d11a396","unit":"°C","label":"Minimale Lagertemperatur","value":"-35"},{"id":"699de42dad0808777d11a397","unit":"","label":"CPR-Klasse","value":"Fca"},{"id":"699de42dad0808777d11a398","unit":"","label":"Flammhemmend","value":"no"}],"voltageLabel":"12/20 kV"},{"id":"699de42dad0808777d11a537","rows":[{"id":"699de42dad0808777d11a48e","cells":[{"id":"699de42dad0808777d11a481","value":"Al"},{"id":"699de42dad0808777d11a482","value":"RM"},{"id":"699de42dad0808777d11a483","value":"0,13"},{"id":"699de42dad0808777d11a484","value":"25,6"},{"id":"699de42dad0808777d11a485","value":"0,641"},{"id":"699de42dad0808777d11a486","value":"8"},{"id":"699de42dad0808777d11a487","value":"187"},{"id":"699de42dad0808777d11a488","value":"174"},{"id":"699de42dad0808777d11a489","value":"4,7"},{"id":"699de42dad0808777d11a48a","value":"2,1"},{"id":"699de42dad0808777d11a48b","value":"700"},{"id":"699de42dad0808777d11a48c","value":"35"},{"id":"699de42dad0808777d11a48d","value":"1100"}],"configuration":"1x50/16"},{"id":"699de42dad0808777d11a49c","cells":[{"id":"699de42dad0808777d11a48f","value":"Al"},{"id":"699de42dad0808777d11a490","value":"RM"},{"id":"699de42dad0808777d11a491","value":"0,15"},{"id":"699de42dad0808777d11a492","value":"27,1"},{"id":"699de42dad0808777d11a493","value":"0,443"},{"id":"699de42dad0808777d11a494","value":"8"},{"id":"699de42dad0808777d11a495","value":"232"},{"id":"699de42dad0808777d11a496","value":"213"},{"id":"699de42dad0808777d11a497","value":"6,6"},{"id":"699de42dad0808777d11a498","value":"2,1"},{"id":"699de42dad0808777d11a499","value":"740"},{"id":"699de42dad0808777d11a49a","value":"37"},{"id":"699de42dad0808777d11a49b","value":"1213"}],"configuration":"1x70/16"},{"id":"699de42dad0808777d11a4aa","cells":[{"id":"699de42dad0808777d11a49d","value":"Al"},{"id":"699de42dad0808777d11a49e","value":"RM"},{"id":"699de42dad0808777d11a49f","value":"0,16"},{"id":"699de42dad0808777d11a4a0","value":"28,6"},{"id":"699de42dad0808777d11a4a1","value":"0,32"},{"id":"699de42dad0808777d11a4a2","value":"8"},{"id":"699de42dad0808777d11a4a3","value":"282"},{"id":"699de42dad0808777d11a4a4","value":"254"},{"id":"699de42dad0808777d11a4a5","value":"9"},{"id":"699de42dad0808777d11a4a6","value":"2,1"},{"id":"699de42dad0808777d11a4a7","value":"760"},{"id":"699de42dad0808777d11a4a8","value":"38"},{"id":"699de42dad0808777d11a4a9","value":"1339"}],"configuration":"1x95/16"},{"id":"699de42dad0808777d11a4b8","cells":[{"id":"699de42dad0808777d11a4ab","value":"Al"},{"id":"699de42dad0808777d11a4ac","value":"RM"},{"id":"699de42dad0808777d11a4ad","value":"0,17"},{"id":"699de42dad0808777d11a4ae","value":"30,1"},{"id":"699de42dad0808777d11a4af","value":"0,253"},{"id":"699de42dad0808777d11a4b0","value":"8"},{"id":"699de42dad0808777d11a4b1","value":"325"},{"id":"699de42dad0808777d11a4b2","value":"289"},{"id":"699de42dad0808777d11a4b3","value":"11,3"},{"id":"699de42dad0808777d11a4b4","value":"2,1"},{"id":"699de42dad0808777d11a4b5","value":"800"},{"id":"699de42dad0808777d11a4b6","value":"40"},{"id":"699de42dad0808777d11a4b7","value":"1463"}],"configuration":"1x120/16"},{"id":"699de42dad0808777d11a4c6","cells":[{"id":"699de42dad0808777d11a4b9","value":"Al"},{"id":"699de42dad0808777d11a4ba","value":"RM"},{"id":"699de42dad0808777d11a4bb","value":"0,19"},{"id":"699de42dad0808777d11a4bc","value":"31,5"},{"id":"699de42dad0808777d11a4bd","value":"0,206"},{"id":"699de42dad0808777d11a4be","value":"8"},{"id":"699de42dad0808777d11a4bf","value":"367"},{"id":"699de42dad0808777d11a4c0","value":"322"},{"id":"699de42dad0808777d11a4c1","value":"14,2"},{"id":"699de42dad0808777d11a4c2","value":"2,1"},{"id":"699de42dad0808777d11a4c3","value":"820"},{"id":"699de42dad0808777d11a4c4","value":"41"},{"id":"699de42dad0808777d11a4c5","value":"1660"}],"configuration":"1x150/25"},{"id":"699de42dad0808777d11a4d4","cells":[{"id":"699de42dad0808777d11a4c7","value":"Al"},{"id":"699de42dad0808777d11a4c8","value":"RM"},{"id":"699de42dad0808777d11a4c9","value":"0,2"},{"id":"699de42dad0808777d11a4ca","value":"33,1"},{"id":"699de42dad0808777d11a4cb","value":"0,164"},{"id":"699de42dad0808777d11a4cc","value":"8"},{"id":"699de42dad0808777d11a4cd","value":"421"},{"id":"699de42dad0808777d11a4ce","value":"364"},{"id":"699de42dad0808777d11a4cf","value":"17,5"},{"id":"699de42dad0808777d11a4d0","value":"2,1"},{"id":"699de42dad0808777d11a4d1","value":"860"},{"id":"699de42dad0808777d11a4d2","value":"43"},{"id":"699de42dad0808777d11a4d3","value":"1837"}],"configuration":"1x185/25"},{"id":"699de42dad0808777d11a4e2","cells":[{"id":"699de42dad0808777d11a4d5","value":"Al"},{"id":"699de42dad0808777d11a4d6","value":"RM"},{"id":"699de42dad0808777d11a4d7","value":"0,22"},{"id":"699de42dad0808777d11a4d8","value":"35,4"},{"id":"699de42dad0808777d11a4d9","value":"0,125"},{"id":"699de42dad0808777d11a4da","value":"8"},{"id":"699de42dad0808777d11a4db","value":"496"},{"id":"699de42dad0808777d11a4dc","value":"422"},{"id":"699de42dad0808777d11a4dd","value":"22,7"},{"id":"699de42dad0808777d11a4de","value":"2,1"},{"id":"699de42dad0808777d11a4df","value":"900"},{"id":"699de42dad0808777d11a4e0","value":"45"},{"id":"699de42dad0808777d11a4e1","value":"2049"}],"configuration":"1x240/25"},{"id":"699de42dad0808777d11a4f0","cells":[{"id":"699de42dad0808777d11a4e3","value":"Al"},{"id":"699de42dad0808777d11a4e4","value":"RM"},{"id":"699de42dad0808777d11a4e5","value":"0,24"},{"id":"699de42dad0808777d11a4e6","value":"37,5"},{"id":"699de42dad0808777d11a4e7","value":"0,1"},{"id":"699de42dad0808777d11a4e8","value":"8"},{"id":"699de42dad0808777d11a4e9","value":"568"},{"id":"699de42dad0808777d11a4ea","value":"476"},{"id":"699de42dad0808777d11a4eb","value":"28,4"},{"id":"699de42dad0808777d11a4ec","value":"2,1"},{"id":"699de42dad0808777d11a4ed","value":"940"},{"id":"699de42dad0808777d11a4ee","value":"47"},{"id":"699de42dad0808777d11a4ef","value":"2336"}],"configuration":"1x300/25"},{"id":"699de42dad0808777d11a4fe","cells":[{"id":"699de42dad0808777d11a4f1","value":"Al"},{"id":"699de42dad0808777d11a4f2","value":"RM"},{"id":"699de42dad0808777d11a4f3","value":"0,27"},{"id":"699de42dad0808777d11a4f4","value":"40,6"},{"id":"699de42dad0808777d11a4f5","value":"0,0778"},{"id":"699de42dad0808777d11a4f6","value":"8"},{"id":"699de42dad0808777d11a4f7","value":"659"},{"id":"699de42dad0808777d11a4f8","value":"541"},{"id":"699de42dad0808777d11a4f9","value":"37,8"},{"id":"699de42dad0808777d11a4fa","value":"2,1"},{"id":"699de42dad0808777d11a4fb","value":"1000"},{"id":"699de42dad0808777d11a4fc","value":"50"},{"id":"699de42dad0808777d11a4fd","value":"2842"}],"configuration":"1x400/35"},{"id":"699de42dad0808777d11a50c","cells":[{"id":"699de42dad0808777d11a4ff","value":"Al"},{"id":"699de42dad0808777d11a500","value":"RM"},{"id":"699de42dad0808777d11a501","value":"0,29"},{"id":"699de42dad0808777d11a502","value":"43,8"},{"id":"699de42dad0808777d11a503","value":"0,0605"},{"id":"699de42dad0808777d11a504","value":"8"},{"id":"699de42dad0808777d11a505","value":"764"},{"id":"699de42dad0808777d11a506","value":"616"},{"id":"699de42dad0808777d11a507","value":"47,3"},{"id":"699de42dad0808777d11a508","value":"2,4"},{"id":"699de42dad0808777d11a509","value":"1080"},{"id":"699de42dad0808777d11a50a","value":"54"},{"id":"699de42dad0808777d11a50b","value":"3269"}],"configuration":"1x500/35"},{"id":"699de42dad0808777d11a51a","cells":[{"id":"699de42dad0808777d11a50d","value":"Al"},{"id":"699de42dad0808777d11a50e","value":"RM"},{"id":"699de42dad0808777d11a50f","value":"0,32"},{"id":"699de42dad0808777d11a510","value":"47,2"},{"id":"699de42dad0808777d11a511","value":"0,0469"},{"id":"699de42dad0808777d11a512","value":"8"},{"id":"699de42dad0808777d11a513","value":"866"},{"id":"699de42dad0808777d11a514","value":"692"},{"id":"699de42dad0808777d11a515","value":"59,6"},{"id":"699de42dad0808777d11a516","value":"2,4"},{"id":"699de42dad0808777d11a517","value":"1120"},{"id":"699de42dad0808777d11a518","value":"56"},{"id":"699de42dad0808777d11a519","value":"3590"}],"configuration":"1x630/35"},{"id":"699de42dad0808777d11a528","cells":[{"id":"699de42dad0808777d11a51b","value":"Al"},{"id":"699de42dad0808777d11a51c","value":"RM"},{"id":"699de42dad0808777d11a51d","value":"0,36"},{"id":"699de42dad0808777d11a51e","value":"51,5"},{"id":"699de42dad0808777d11a51f","value":"0,0367"},{"id":"699de42dad0808777d11a520","value":"8"},{"id":"699de42dad0808777d11a521","value":"984"},{"id":"699de42dad0808777d11a522","value":"770"},{"id":"699de42dad0808777d11a523","value":"75,6"},{"id":"699de42dad0808777d11a524","value":"2,4"},{"id":"699de42dad0808777d11a525","value":"1200"},{"id":"699de42dad0808777d11a526","value":"60"},{"id":"699de42dad0808777d11a527","value":"4284"}],"configuration":"1x800/35"},{"id":"699de42dad0808777d11a536","cells":[{"id":"699de42dad0808777d11a529","value":"Al"},{"id":"699de42dad0808777d11a52a","value":"RM"},{"id":"699de42dad0808777d11a52b","value":"0,39"},{"id":"699de42dad0808777d11a52c","value":"55,4"},{"id":"699de42dad0808777d11a52d","value":"0,0291"},{"id":"699de42dad0808777d11a52e","value":"8"},{"id":"699de42dad0808777d11a52f","value":"1196"},{"id":"699de42dad0808777d11a530","value":"878"},{"id":"699de42dad0808777d11a531","value":"94"},{"id":"699de42dad0808777d11a532","value":"2,4"},{"id":"699de42dad0808777d11a533","value":"1340"},{"id":"699de42dad0808777d11a534","value":"67"},{"id":"699de42dad0808777d11a535","value":"5327"}],"configuration":"1x1000/35"}],"columns":[{"id":"699de42dad0808777d11a474","key":"Cond","label":"Leiter"},{"id":"699de42dad0808777d11a475","key":"shape","label":"Form"},{"id":"699de42dad0808777d11a476","key":"cap","label":"Cap [uF/km]"},{"id":"699de42dad0808777d11a477","key":"DI","label":"DI [mm]"},{"id":"699de42dad0808777d11a478","key":"RI","label":"RI [Ohm/km]"},{"id":"699de42dad0808777d11a479","key":"Wi","label":"Wi [mm]"},{"id":"699de42dad0808777d11a47a","key":"Ibl","label":"Ibl [A]"},{"id":"699de42dad0808777d11a47b","key":"Ibe","label":"Ibe [A]"},{"id":"699de42dad0808777d11a47c","key":"Ik_cond","label":"Ik [kA]"},{"id":"699de42dad0808777d11a47d","key":"Wm","label":"Wm [mm]"},{"id":"699de42dad0808777d11a47e","key":"Rbv","label":"Rbv [mm]"},{"id":"699de42dad0808777d11a47f","key":"Ø","label":"Ø [mm]"},{"id":"699de42dad0808777d11a480","key":"G","label":"G [kg/km]"}],"metaItems":[{"id":"699de42dad0808777d11a46b","label":"Spannung","value":"18/30 kV"},{"id":"699de42dad0808777d11a46c","unit":"kV","label":"Prüfspannung","value":"63"},{"id":"699de42dad0808777d11a46d","unit":"°C","label":"Temperaturbereich","value":"-35-+90"},{"id":"699de42dad0808777d11a46e","unit":"°C","label":"Leitertemperatur (max.)","value":"+90"},{"id":"699de42dad0808777d11a46f","unit":"°C","label":"Kurzschlusstemperatur (max.)","value":"+250"},{"id":"699de42dad0808777d11a470","unit":"°C","label":"Minimale Verlegetemperatur","value":"-20"},{"id":"699de42dad0808777d11a471","unit":"°C","label":"Minimale Lagertemperatur","value":"-35"},{"id":"699de42dad0808777d11a472","unit":"","label":"CPR-Klasse","value":"Fca"},{"id":"699de42dad0808777d11a473","unit":"","label":"Flammhemmend","value":"no"}],"voltageLabel":"18/30 kV"}],"technicalItems":[{"id":"699de42dad0808777d11a2ad","unit":"","label":"CPR class","value":"Fca"},{"id":"699de42dad0808777d11a2ae","unit":"","label":"Flame retardant","value":"no"},{"id":"699de42dad0808777d11a2af","unit":"°C","label":"Maximal operating conductor temperature (°C)","value":"+90"},{"id":"699de42dad0808777d11a2b0","unit":"°C","label":"Maximal short-circuit temperature (°C)","value":"+250"},{"id":"699de42dad0808777d11a2b1","unit":"°C","label":"Minimal storage temperature (°C)","value":"-35"},{"id":"699de42dad0808777d11a2b2","unit":"°C","label":"Minimal temperature for laying (°C)","value":"-20"},{"id":"699de42dad0808777d11a2b3","unit":"","label":"Shape of conductor","value":"RM"},{"id":"699de42dad0808777d11a2b4","unit":"°C","label":"Temperaturbereich (°C)","value":"-35-+90"}],"id":"69f85c4f31a177188da0eb2f"}} />

