---
title: H1Z2Z2-K
sku: H1Z2Z2-K-solar-cables
slug: h1z2z2-k
description: >
  Das H1Z2Z2-K Kabel ist ein hochflexibles, halogenfreies Solarkabel für moderne
  Photovoltaikanlagen. Es erfüllt höchste Anforderungen an Sicherheit,
  Wetterbeständigkeit und elektrische Belastbarkeit – sowohl im Innen- als auch
  im Außeneinsatz.
categories:
  - id: 699de430ad0808777d11bc34
    category: Solarkabel
featuredImage:
  id: 42
  alt: H1Z2Z2 K scaled
  caption: null
  updatedAt: '2026-02-24T17:47:28.769Z'
  createdAt: '2026-02-24T17:47:28.769Z'
  url: /media/H1Z2Z2-K-scaled-5.webp
  thumbnailURL: /media/H1Z2Z2-K-scaled-5-600x125.webp
  filename: H1Z2Z2-K-scaled-5.webp
  mimeType: image/webp
  filesize: 39416
  width: 2560
  height: 533
  focalX: 50
  focalY: 50
  sizes:
    thumbnail:
      url: /media/H1Z2Z2-K-scaled-5-600x125.webp
      width: 600
      height: 125
      mimeType: image/webp
      filesize: 3974
      filename: H1Z2Z2-K-scaled-5-600x125.webp
    card:
      url: /media/H1Z2Z2-K-scaled-5-768x160.webp
      width: 768
      height: 160
      mimeType: image/webp
      filesize: 5940
      filename: H1Z2Z2-K-scaled-5-768x160.webp
    tablet:
      url: /media/H1Z2Z2-K-scaled-5-1024x213.webp
      width: 1024
      height: 213
      mimeType: image/webp
      filesize: 8584
      filename: H1Z2Z2-K-scaled-5-1024x213.webp
images:
  - id: 42
    alt: H1Z2Z2 K scaled
    caption: null
    updatedAt: '2026-02-24T17:47:28.769Z'
    createdAt: '2026-02-24T17:47:28.769Z'
    url: /media/H1Z2Z2-K-scaled-5.webp
    thumbnailURL: /media/H1Z2Z2-K-scaled-5-600x125.webp
    filename: H1Z2Z2-K-scaled-5.webp
    mimeType: image/webp
    filesize: 39416
    width: 2560
    height: 533
    focalX: 50
    focalY: 50
    sizes:
      thumbnail:
        url: /media/H1Z2Z2-K-scaled-5-600x125.webp
        width: 600
        height: 125
        mimeType: image/webp
        filesize: 3974
        filename: H1Z2Z2-K-scaled-5-600x125.webp
      card:
        url: /media/H1Z2Z2-K-scaled-5-768x160.webp
        width: 768
        height: 160
        mimeType: image/webp
        filesize: 5940
        filename: H1Z2Z2-K-scaled-5-768x160.webp
      tablet:
        url: /media/H1Z2Z2-K-scaled-5-1024x213.webp
        width: 1024
        height: 213
        mimeType: image/webp
        filesize: 8584
        filename: H1Z2Z2-K-scaled-5-1024x213.webp
application:
  root:
    type: root
    format: ''
    indent: 0
    version: 1
    children:
      - type: paragraph
        format: ''
        indent: 0
        version: 1
        children:
          - mode: normal
            text: >-
              Das H1Z2Z2-K entspricht der Norm DIN EN 50618 (VDE 0283-618) und
              ist speziell für die Verkabelung von Photovoltaiksystemen
              konzipiert. Es kann fest verlegt oder flexibel geführt werden – im
              Gebäude, im Freien, in Industrieanlagen, landwirtschaftlichen
              Betrieben oder sogar in explosionsgefährdeten Bereichen. Die
              Leitung ist UV-, ozon- und wasserbeständig (AD7) und darf direkt
              in der Erde verlegt werden.
            type: text
            style: ''
            detail: 0
            format: 0
            version: 1
        direction: ltr
    direction: ltr
_status: published
---
}>

#### Für dauerhafte Einsätze in anspruchsvollen Umgebungen

Das **H1Z2Z2-K** entspricht der **Norm DIN EN 50618 (VDE 0283-618)** und ist speziell für die **Verkabelung von Photovoltaiksystemen** konzipiert. Es kann **fest verlegt oder flexibel geführt** werden – im Gebäude, im Freien, in Industrieanlagen, landwirtschaftlichen Betrieben oder sogar in **explosionsgefährdeten Bereichen**. Die Leitung ist **UV-, ozon- und wasserbeständig (AD7)** und darf **direkt in der Erde verlegt** werden.

#### Aufbau und technische Merkmale

Der feindrähtige **verzinnt Kupferleiter (Klasse 5)** ist doppelt geschützt durch eine **vernetzte Isolierung und einen vernetzten Außenmantel aus Polyolefincopolymer** – halogenfrei, flammwidrig und mit hoher Abriebfestigkeit. Das Kabel ist für eine maximale Leitertemperatur von **120 °C** ausgelegt und bleibt auch bei **-40 °C (fest verlegt)** zuverlässig flexibel. Die **geringe Rauchentwicklung** und hohe Beständigkeit gegenüber mechanischen und thermischen Einflüssen sorgen für einen sicheren, langjährigen Betrieb.

#### Eigenschaften im Überblick

<ul>
<li>
**Halogenfrei, flammwidrig, UV- und ozonbeständig**

</li>
<li>
**Kurzschluss- und erdschlusssicher gemäß VDE-AR-E 2283-4**

</li>
<li>
**Zugelassen für Innenräume, Außenbereiche und explosionsgefährdete Zonen**

</li>
<li>
**Geeignet für direkte Erdverlegung**

</li>
<li>
**CPR-Leistungsklasse: Eca**

</li>
</ul>

<Block type="productTabs" data={{"blockType":"productTabs","voltageTables":[{"id":"699de430ad0808777d11bc87","rows":[{"id":"699de430ad0808777d11bc4e","cells":[{"id":"699de430ad0808777d11bc48","value":""},{"id":"699de430ad0808777d11bc49","value":"RM"},{"id":"699de430ad0808777d11bc4a","value":"13,7"},{"id":"699de430ad0808777d11bc4b","value":"22"},{"id":"699de430ad0808777d11bc4c","value":"4,5"},{"id":"699de430ad0808777d11bc4d","value":"33"}],"configuration":"1x1,5"},{"id":"699de430ad0808777d11bc55","cells":[{"id":"699de430ad0808777d11bc4f","value":""},{"id":"699de430ad0808777d11bc50","value":"RM"},{"id":"699de430ad0808777d11bc51","value":"8,21"},{"id":"699de430ad0808777d11bc52","value":"24"},{"id":"699de430ad0808777d11bc53","value":"4,9"},{"id":"699de430ad0808777d11bc54","value":"41"}],"configuration":"1x2,5"},{"id":"699de430ad0808777d11bc5c","cells":[{"id":"699de430ad0808777d11bc56","value":""},{"id":"699de430ad0808777d11bc57","value":"RM"},{"id":"699de430ad0808777d11bc58","value":"5,09"},{"id":"699de430ad0808777d11bc59","value":"26"},{"id":"699de430ad0808777d11bc5a","value":"5,5"},{"id":"699de430ad0808777d11bc5b","value":"57"}],"configuration":"1x4"},{"id":"699de430ad0808777d11bc63","cells":[{"id":"699de430ad0808777d11bc5d","value":""},{"id":"699de430ad0808777d11bc5e","value":"RM"},{"id":"699de430ad0808777d11bc5f","value":"3,39"},{"id":"699de430ad0808777d11bc60","value":"30"},{"id":"699de430ad0808777d11bc61","value":"5,9"},{"id":"699de430ad0808777d11bc62","value":"73"}],"configuration":"1x6"},{"id":"699de430ad0808777d11bc6a","cells":[{"id":"699de430ad0808777d11bc64","value":""},{"id":"699de430ad0808777d11bc65","value":"RM"},{"id":"699de430ad0808777d11bc66","value":"1,95"},{"id":"699de430ad0808777d11bc67","value":"35"},{"id":"699de430ad0808777d11bc68","value":"6,9"},{"id":"699de430ad0808777d11bc69","value":"110"}],"configuration":"1x10"},{"id":"699de430ad0808777d11bc71","cells":[{"id":"699de430ad0808777d11bc6b","value":""},{"id":"699de430ad0808777d11bc6c","value":"RM"},{"id":"699de430ad0808777d11bc6d","value":"1,24"},{"id":"699de430ad0808777d11bc6e","value":"40"},{"id":"699de430ad0808777d11bc6f","value":"8"},{"id":"699de430ad0808777d11bc70","value":"170"}],"configuration":"1x16"},{"id":"699de430ad0808777d11bc78","cells":[{"id":"699de430ad0808777d11bc72","value":""},{"id":"699de430ad0808777d11bc73","value":"RM"},{"id":"699de430ad0808777d11bc74","value":"0,795"},{"id":"699de430ad0808777d11bc75","value":"50"},{"id":"699de430ad0808777d11bc76","value":"10"},{"id":"699de430ad0808777d11bc77","value":"260"}],"configuration":"1x25"},{"id":"699de430ad0808777d11bc7f","cells":[{"id":"699de430ad0808777d11bc79","value":""},{"id":"699de430ad0808777d11bc7a","value":"RM"},{"id":"699de430ad0808777d11bc7b","value":"0,565"},{"id":"699de430ad0808777d11bc7c","value":"56"},{"id":"699de430ad0808777d11bc7d","value":"11"},{"id":"699de430ad0808777d11bc7e","value":"360"}],"configuration":"1x35"},{"id":"699de430ad0808777d11bc86","cells":[{"id":"699de430ad0808777d11bc80","value":""},{"id":"699de430ad0808777d11bc81","value":"RM"},{"id":"699de430ad0808777d11bc82","value":"0,393"},{"id":"699de430ad0808777d11bc83","value":"60"},{"id":"699de430ad0808777d11bc84","value":"13,2"},{"id":"699de430ad0808777d11bc85","value":"500"}],"configuration":"1x50"}],"columns":[{"id":"699de430ad0808777d11bc42","key":"Cond","label":"Leiter"},{"id":"699de430ad0808777d11bc43","key":"shape","label":"Form"},{"id":"699de430ad0808777d11bc44","key":"RI","label":"RI [Ohm/km]"},{"id":"699de430ad0808777d11bc45","key":"Rbv","label":"Rbv [mm]"},{"id":"699de430ad0808777d11bc46","key":"Ø","label":"Ø [mm]"},{"id":"699de430ad0808777d11bc47","key":"G","label":"G [kg/km]"}],"metaItems":[{"id":"699de430ad0808777d11bc3c","label":"Spannung","value":"AC: 1000 / 1000 V DC: 1500 V"},{"id":"699de430ad0808777d11bc3d","unit":"kV","label":"Prüfspannung","value":"6,5 AC, 15 DC (5 min.)"},{"id":"699de430ad0808777d11bc3e","unit":"°C","label":"Temperaturbereich","value":"-40/+90"},{"id":"699de430ad0808777d11bc3f","unit":"°C","label":"Leitertemperatur (max.)","value":"120"},{"id":"699de430ad0808777d11bc40","unit":"°C","label":"Kurzschlusstemperatur (max.)","value":"+250 Max. 5 sec."},{"id":"699de430ad0808777d11bc41","unit":"°C","label":"Minimale Verlegetemperatur","value":"-25"}],"voltageLabel":"AC: 1000 / 1000 V DC: 1500 V"}],"technicalItems":[{"id":"699de430ad0808777d11bc35","unit":"°C","label":"Maximal operating conductor temperature (°C)","value":"120"},{"id":"699de430ad0808777d11bc36","unit":"°C","label":"Maximal short-circuit temperature (°C)","value":"+250 Max. 5 sec."},{"id":"699de430ad0808777d11bc37","unit":"°C","label":"Minimal temperature for laying (°C)","value":"-25"},{"id":"699de430ad0808777d11bc38","unit":"kV","label":"Nennspannung (kV)","value":"AC: 1000/1000 V DC: 1500 V"},{"id":"699de430ad0808777d11bc39","unit":"kV","label":"Prüfspannung (kV)","value":"6,5 AC, 15 DC (5 min.)"},{"id":"699de430ad0808777d11bc3a","unit":"","label":"Shape of conductor","value":"RM"},{"id":"699de430ad0808777d11bc3b","unit":"°C","label":"Temperaturbereich (°C)","value":"-40/+90"}],"id":"69f85c4f31a177188da0eb23"}} />
