---
title: NYCWY
sku: NYCWY-low-voltage-cables
slug: nycwy
description: >
  NYCWY Kabel sind robuste Niederspannungskabel mit konzentrischem Leiter,
  geeignet für die Energieverteilung in Gebäuden, Industrieanlagen und bei
  Erdverlegung. Durch PVC-Isolierung und -Mantel sind sie mechanisch stabil,
  feuchtigkeitsresistent und vielseitig einsetzbar – auch in Beton oder Wasser.
categories:
  - id: 699de430ad0808777d11b740
    category: Niederspannungskabel
featuredImage:
  id: 40
  alt: NYCWY scaled
  caption: null
  updatedAt: '2026-02-24T17:47:28.274Z'
  createdAt: '2026-02-24T17:47:28.274Z'
  url: /media/NYCWY-scaled-5.webp
  thumbnailURL: /media/NYCWY-scaled-5-600x125.webp
  filename: NYCWY-scaled-5.webp
  mimeType: image/webp
  filesize: 39890
  width: 2560
  height: 533
  focalX: 50
  focalY: 50
  sizes:
    thumbnail:
      url: /media/NYCWY-scaled-5-600x125.webp
      width: 600
      height: 125
      mimeType: image/webp
      filesize: 4694
      filename: NYCWY-scaled-5-600x125.webp
    card:
      url: /media/NYCWY-scaled-5-768x160.webp
      width: 768
      height: 160
      mimeType: image/webp
      filesize: 7022
      filename: NYCWY-scaled-5-768x160.webp
    tablet:
      url: /media/NYCWY-scaled-5-1024x213.webp
      width: 1024
      height: 213
      mimeType: image/webp
      filesize: 10414
      filename: NYCWY-scaled-5-1024x213.webp
images:
  - id: 40
    alt: NYCWY scaled
    caption: null
    updatedAt: '2026-02-24T17:47:28.274Z'
    createdAt: '2026-02-24T17:47:28.274Z'
    url: /media/NYCWY-scaled-5.webp
    thumbnailURL: /media/NYCWY-scaled-5-600x125.webp
    filename: NYCWY-scaled-5.webp
    mimeType: image/webp
    filesize: 39890
    width: 2560
    height: 533
    focalX: 50
    focalY: 50
    sizes:
      thumbnail:
        url: /media/NYCWY-scaled-5-600x125.webp
        width: 600
        height: 125
        mimeType: image/webp
        filesize: 4694
        filename: NYCWY-scaled-5-600x125.webp
      card:
        url: /media/NYCWY-scaled-5-768x160.webp
        width: 768
        height: 160
        mimeType: image/webp
        filesize: 7022
        filename: NYCWY-scaled-5-768x160.webp
      tablet:
        url: /media/NYCWY-scaled-5-1024x213.webp
        width: 1024
        height: 213
        mimeType: image/webp
        filesize: 10414
        filename: NYCWY-scaled-5-1024x213.webp
application:
  root:
    type: root
    format: ''
    indent: 0
    version: 1
    children:
      - type: paragraph
        format: ''
        indent: 0
        version: 1
        children:
          - mode: normal
            text: >-
              Das NYCWY gehört zu den klassischen Niederspannungskabeln nach
              VDE-Standard und ist für Nennspannungen bis 1 kV ausgelegt. Es
              kommt überall dort zum Einsatz, wo Energie zuverlässig verteilt
              werden muss – in Gebäuden, Industrieanlagen, Trafostationen oder
              direkt im Erdreich. Auch in Kabeltrassen, Betonumgebungen oder
              unter Wasser lässt es sich problemlos verlegen. Die Materialwahl
              sorgt dafür, dass dieses Kabel selbst unter rauen Bedingungen
              durchhält – ganz ohne zusätzliche Schutzmaßnahmen.
            type: text
            style: ''
            detail: 0
            format: 0
            version: 1
        direction: ltr
    direction: ltr
_status: published
---
<Block type="productTabs" data={{"content":{"root":{"type":"root","format":"","indent":0,"version":1,"children":[{"type":"paragraph","format":"","indent":0,"version":1,"children":[{"mode":"normal","text":"}>","type":"text","style":"","detail":0,"format":0,"version":1}],"direction":"ltr"},{"tag":"h4","type":"heading","format":"","indent":0,"version":1,"children":[{"mode":"normal","text":"Vielseitig einsetzbar in der Energieverteilung","type":"text","style":"","detail":0,"format":0,"version":1}],"direction":"ltr"},{"type":"paragraph","format":"","indent":0,"version":1,"children":[{"mode":"normal","text":"Das NYCWY gehört zu den klassischen ","type":"text","style":"","detail":0,"format":0,"version":1},{"mode":"normal","text":"Niederspannungskabeln nach VDE-Standard","type":"text","style":"","detail":0,"format":1,"version":1},{"mode":"normal","text":" und ist für Nennspannungen bis 1 kV ausgelegt. Es kommt überall dort zum Einsatz, wo Energie zuverlässig verteilt werden muss – in Gebäuden, Industrieanlagen, Trafostationen oder direkt im Erdreich. Auch in Kabeltrassen, Betonumgebungen oder unter Wasser lässt es sich problemlos verlegen. Die Materialwahl sorgt dafür, dass dieses Kabel selbst unter rauen Bedingungen durchhält – ganz ohne zusätzliche Schutzmaßnahmen.","type":"text","style":"","detail":0,"format":0,"version":1}],"direction":"ltr"},{"tag":"h4","type":"heading","format":"","indent":0,"version":1,"children":[{"mode":"normal","text":"Aufbau und Materialien","type":"text","style":"","detail":0,"format":0,"version":1}],"direction":"ltr"},{"type":"paragraph","format":"","indent":0,"version":1,"children":[{"mode":"normal","text":"Der Aufbau ist technisch durchdacht: Ein Kupferleiter bildet das Herzstück, umgeben von einer PVC-Isolierung, die mechanisch robust und elektrisch sicher ist. Darauf folgt ein konzentrischer Leiter in Wellenform, der je nach Anwendung als Schutz- oder Rückleiter dient. Den äußeren Abschluss bildet ein widerstandsfähiger ","type":"text","style":"","detail":0,"format":0,"version":1},{"mode":"normal","text":"PVC-Mantel","type":"text","style":"","detail":0,"format":1,"version":1},{"mode":"normal","text":", der das Kabel vor Feuchtigkeit, Druck und chemischen Einflüssen schützt.","type":"text","style":"","detail":0,"format":0,"version":1}],"direction":"ltr"},{"tag":"h4","type":"heading","format":"","indent":0,"version":1,"children":[{"mode":"normal","text":"Varianten und Querschnitte","type":"text","style":"","detail":0,"format":0,"version":1}],"direction":"ltr"},{"type":"paragraph","format":"","indent":0,"version":1,"children":[{"mode":"normal","text":"Erhältlich ist das NYCWY in einer Vielzahl von Ausführungen – zum Beispiel als ","type":"text","style":"","detail":0,"format":0,"version":1},{"mode":"normal","text":"4x25/16","type":"text","style":"","detail":0,"format":1,"version":1},{"mode":"normal","text":", 4x70/35 oder 4x185/95. Die erste Zahlengruppe steht für die Anzahl und den Querschnitt der stromführenden Leiter, die zweite für den konzentrischen Leiter. Damit lässt sich das Kabel flexibel an verschiedene Netzanforderungen anpassen – vom Hausanschluss bis zur industriellen Energieverteilung.","type":"text","style":"","detail":0,"format":0,"version":1}],"direction":"ltr"}],"direction":"ltr"}},"blockType":"productTabs","voltageTables":[{"id":"699de430ad0808777d11b8d6","rows":[{"id":"699de430ad0808777d11b764","cells":[{"id":"699de430ad0808777d11b75c","value":"Cu"},{"id":"699de430ad0808777d11b75d","value":"RE"},{"id":"699de430ad0808777d11b75e","value":"1,83"},{"id":"699de430ad0808777d11b75f","value":"1"},{"id":"699de430ad0808777d11b760","value":"1,8"},{"id":"699de430ad0808777d11b761","value":"12xD"},{"id":"699de430ad0808777d11b762","value":"19"},{"id":"699de430ad0808777d11b763","value":"670"}],"configuration":"2x10/10"},{"id":"699de430ad0808777d11b76d","cells":[{"id":"699de430ad0808777d11b765","value":"Cu"},{"id":"699de430ad0808777d11b766","value":"RE"},{"id":"699de430ad0808777d11b767","value":"1,15"},{"id":"699de430ad0808777d11b768","value":"1"},{"id":"699de430ad0808777d11b769","value":"1,8"},{"id":"699de430ad0808777d11b76a","value":"12xD"},{"id":"699de430ad0808777d11b76b","value":"21"},{"id":"699de430ad0808777d11b76c","value":"890"}],"configuration":"2x16/16"},{"id":"699de430ad0808777d11b776","cells":[{"id":"699de430ad0808777d11b76e","value":"Cu"},{"id":"699de430ad0808777d11b76f","value":"RE"},{"id":"699de430ad0808777d11b770","value":"1,83"},{"id":"699de430ad0808777d11b771","value":"1"},{"id":"699de430ad0808777d11b772","value":"1,8"},{"id":"699de430ad0808777d11b773","value":"12xD"},{"id":"699de430ad0808777d11b774","value":"20"},{"id":"699de430ad0808777d11b775","value":"773"}],"configuration":"3x10/10"},{"id":"699de430ad0808777d11b77f","cells":[{"id":"699de430ad0808777d11b777","value":"Cu"},{"id":"699de430ad0808777d11b778","value":"RMV"},{"id":"699de430ad0808777d11b779","value":"1,83"},{"id":"699de430ad0808777d11b77a","value":"1"},{"id":"699de430ad0808777d11b77b","value":"1,8"},{"id":"699de430ad0808777d11b77c","value":"12xD"},{"id":"699de430ad0808777d11b77d","value":"21"},{"id":"699de430ad0808777d11b77e","value":"817"}],"configuration":"3x10/10"},{"id":"699de430ad0808777d11b788","cells":[{"id":"699de430ad0808777d11b780","value":"Cu"},{"id":"699de430ad0808777d11b781","value":"RE"},{"id":"699de430ad0808777d11b782","value":"1,15"},{"id":"699de430ad0808777d11b783","value":"1"},{"id":"699de430ad0808777d11b784","value":"1,8"},{"id":"699de430ad0808777d11b785","value":"12xD"},{"id":"699de430ad0808777d11b786","value":"22"},{"id":"699de430ad0808777d11b787","value":"1045"}],"configuration":"3x16/16"},{"id":"699de430ad0808777d11b791","cells":[{"id":"699de430ad0808777d11b789","value":"Cu"},{"id":"699de430ad0808777d11b78a","value":"RMV"},{"id":"699de430ad0808777d11b78b","value":"1,15"},{"id":"699de430ad0808777d11b78c","value":"1"},{"id":"699de430ad0808777d11b78d","value":"1,8"},{"id":"699de430ad0808777d11b78e","value":"12xD"},{"id":"699de430ad0808777d11b78f","value":"22"},{"id":"699de430ad0808777d11b790","value":"1085"}],"configuration":"3x16/16"},{"id":"699de430ad0808777d11b79a","cells":[{"id":"699de430ad0808777d11b792","value":"Cu"},{"id":"699de430ad0808777d11b793","value":"RMV"},{"id":"699de430ad0808777d11b794","value":"0,727"},{"id":"699de430ad0808777d11b795","value":"1,2"},{"id":"699de430ad0808777d11b796","value":"1,8"},{"id":"699de430ad0808777d11b797","value":"12xD"},{"id":"699de430ad0808777d11b798","value":"26"},{"id":"699de430ad0808777d11b799","value":"1490"}],"configuration":"3x25/16"},{"id":"699de430ad0808777d11b7a3","cells":[{"id":"699de430ad0808777d11b79b","value":"Cu"},{"id":"699de430ad0808777d11b79c","value":"RMV"},{"id":"699de430ad0808777d11b79d","value":"0,727"},{"id":"699de430ad0808777d11b79e","value":"1,2"},{"id":"699de430ad0808777d11b79f","value":"1,8"},{"id":"699de430ad0808777d11b7a0","value":"12xD"},{"id":"699de430ad0808777d11b7a1","value":"26"},{"id":"699de430ad0808777d11b7a2","value":"1582"}],"configuration":"3x25/25"},{"id":"699de430ad0808777d11b7ac","cells":[{"id":"699de430ad0808777d11b7a4","value":"Cu"},{"id":"699de430ad0808777d11b7a5","value":"SM"},{"id":"699de430ad0808777d11b7a6","value":"0,524"},{"id":"699de430ad0808777d11b7a7","value":"1,2"},{"id":"699de430ad0808777d11b7a8","value":"1,8"},{"id":"699de430ad0808777d11b7a9","value":"12xD"},{"id":"699de430ad0808777d11b7aa","value":"26"},{"id":"699de430ad0808777d11b7ab","value":"1729"}],"configuration":"3x35/16"},{"id":"699de430ad0808777d11b7b5","cells":[{"id":"699de430ad0808777d11b7ad","value":"Cu"},{"id":"699de430ad0808777d11b7ae","value":"SM"},{"id":"699de430ad0808777d11b7af","value":"0,524"},{"id":"699de430ad0808777d11b7b0","value":"1,2"},{"id":"699de430ad0808777d11b7b1","value":"1,8"},{"id":"699de430ad0808777d11b7b2","value":"12xD"},{"id":"699de430ad0808777d11b7b3","value":"26"},{"id":"699de430ad0808777d11b7b4","value":"1913"}],"configuration":"3x35/35"},{"id":"699de430ad0808777d11b7be","cells":[{"id":"699de430ad0808777d11b7b6","value":"Cu"},{"id":"699de430ad0808777d11b7b7","value":"SM"},{"id":"699de430ad0808777d11b7b8","value":"0,387"},{"id":"699de430ad0808777d11b7b9","value":"1,4"},{"id":"699de430ad0808777d11b7ba","value":"1,9"},{"id":"699de430ad0808777d11b7bb","value":"12xD"},{"id":"699de430ad0808777d11b7bc","value":"29"},{"id":"699de430ad0808777d11b7bd","value":"2272"}],"configuration":"3x50/25"},{"id":"699de430ad0808777d11b7c7","cells":[{"id":"699de430ad0808777d11b7bf","value":"Cu"},{"id":"699de430ad0808777d11b7c0","value":"SM"},{"id":"699de430ad0808777d11b7c1","value":"0,387"},{"id":"699de430ad0808777d11b7c2","value":"1,4"},{"id":"699de430ad0808777d11b7c3","value":"1,9"},{"id":"699de430ad0808777d11b7c4","value":"12xD"},{"id":"699de430ad0808777d11b7c5","value":"30"},{"id":"699de430ad0808777d11b7c6","value":"2498"}],"configuration":"3x50/50"},{"id":"699de430ad0808777d11b7d0","cells":[{"id":"699de430ad0808777d11b7c8","value":"Cu"},{"id":"699de430ad0808777d11b7c9","value":"SM"},{"id":"699de430ad0808777d11b7ca","value":"0,268"},{"id":"699de430ad0808777d11b7cb","value":"1,4"},{"id":"699de430ad0808777d11b7cc","value":"2"},{"id":"699de430ad0808777d11b7cd","value":"12xD"},{"id":"699de430ad0808777d11b7ce","value":"33"},{"id":"699de430ad0808777d11b7cf","value":"3128"}],"configuration":"3x70/35"},{"id":"699de430ad0808777d11b7d9","cells":[{"id":"699de430ad0808777d11b7d1","value":"Cu"},{"id":"699de430ad0808777d11b7d2","value":"SM"},{"id":"699de430ad0808777d11b7d3","value":"0,268"},{"id":"699de430ad0808777d11b7d4","value":"1,4"},{"id":"699de430ad0808777d11b7d5","value":"2"},{"id":"699de430ad0808777d11b7d6","value":"12xD"},{"id":"699de430ad0808777d11b7d7","value":"34"},{"id":"699de430ad0808777d11b7d8","value":"3473"}],"configuration":"3x70/70"},{"id":"699de430ad0808777d11b7e2","cells":[{"id":"699de430ad0808777d11b7da","value":"Cu"},{"id":"699de430ad0808777d11b7db","value":"SM"},{"id":"699de430ad0808777d11b7dc","value":"0,193"},{"id":"699de430ad0808777d11b7dd","value":"1,6"},{"id":"699de430ad0808777d11b7de","value":"2,2"},{"id":"699de430ad0808777d11b7df","value":"12xD"},{"id":"699de430ad0808777d11b7e0","value":"38"},{"id":"699de430ad0808777d11b7e1","value":"4177"}],"configuration":"3x95/50"},{"id":"699de430ad0808777d11b7eb","cells":[{"id":"699de430ad0808777d11b7e3","value":"Cu"},{"id":"699de430ad0808777d11b7e4","value":"SM"},{"id":"699de430ad0808777d11b7e5","value":"0,193"},{"id":"699de430ad0808777d11b7e6","value":"1,6"},{"id":"699de430ad0808777d11b7e7","value":"2,2"},{"id":"699de430ad0808777d11b7e8","value":"12xD"},{"id":"699de430ad0808777d11b7e9","value":"38"},{"id":"699de430ad0808777d11b7ea","value":"4640"}],"configuration":"3x95/95"},{"id":"699de430ad0808777d11b7f4","cells":[{"id":"699de430ad0808777d11b7ec","value":"Cu"},{"id":"699de430ad0808777d11b7ed","value":"SM"},{"id":"699de430ad0808777d11b7ee","value":"0,153"},{"id":"699de430ad0808777d11b7ef","value":"1,6"},{"id":"699de430ad0808777d11b7f0","value":"2,3"},{"id":"699de430ad0808777d11b7f1","value":"12xD"},{"id":"699de430ad0808777d11b7f2","value":"41"},{"id":"699de430ad0808777d11b7f3","value":"5168"}],"configuration":"3x120/70"},{"id":"699de430ad0808777d11b7fd","cells":[{"id":"699de430ad0808777d11b7f5","value":"Cu"},{"id":"699de430ad0808777d11b7f6","value":"SM"},{"id":"699de430ad0808777d11b7f7","value":"0,153"},{"id":"699de430ad0808777d11b7f8","value":"1,6"},{"id":"699de430ad0808777d11b7f9","value":"2,3"},{"id":"699de430ad0808777d11b7fa","value":"12xD"},{"id":"699de430ad0808777d11b7fb","value":"41"},{"id":"699de430ad0808777d11b7fc","value":"5674"}],"configuration":"3x120/120"},{"id":"699de430ad0808777d11b806","cells":[{"id":"699de430ad0808777d11b7fe","value":"Cu"},{"id":"699de430ad0808777d11b7ff","value":"SM"},{"id":"699de430ad0808777d11b800","value":"0,124"},{"id":"699de430ad0808777d11b801","value":"1,8"},{"id":"699de430ad0808777d11b802","value":"2,4"},{"id":"699de430ad0808777d11b803","value":"12xD"},{"id":"699de430ad0808777d11b804","value":"46"},{"id":"699de430ad0808777d11b805","value":"6193"}],"configuration":"3x150/70"},{"id":"699de430ad0808777d11b80f","cells":[{"id":"699de430ad0808777d11b807","value":"Cu"},{"id":"699de430ad0808777d11b808","value":"SM"},{"id":"699de430ad0808777d11b809","value":"0,124"},{"id":"699de430ad0808777d11b80a","value":"1,8"},{"id":"699de430ad0808777d11b80b","value":"2,4"},{"id":"699de430ad0808777d11b80c","value":"12xD"},{"id":"699de430ad0808777d11b80d","value":"47"},{"id":"699de430ad0808777d11b80e","value":"6982"}],"configuration":"3x150/150"},{"id":"699de430ad0808777d11b818","cells":[{"id":"699de430ad0808777d11b810","value":"Cu"},{"id":"699de430ad0808777d11b811","value":"SM"},{"id":"699de430ad0808777d11b812","value":"0,0991"},{"id":"699de430ad0808777d11b813","value":"2"},{"id":"699de430ad0808777d11b814","value":"2,6"},{"id":"699de430ad0808777d11b815","value":"12xD"},{"id":"699de430ad0808777d11b816","value":"50"},{"id":"699de430ad0808777d11b817","value":"7689"}],"configuration":"3x185/95"},{"id":"699de430ad0808777d11b821","cells":[{"id":"699de430ad0808777d11b819","value":"Cu"},{"id":"699de430ad0808777d11b81a","value":"SM"},{"id":"699de430ad0808777d11b81b","value":"0,0991"},{"id":"699de430ad0808777d11b81c","value":"2"},{"id":"699de430ad0808777d11b81d","value":"2,6"},{"id":"699de430ad0808777d11b81e","value":"12xD"},{"id":"699de430ad0808777d11b81f","value":"51"},{"id":"699de430ad0808777d11b820","value":"8609"}],"configuration":"3x185/185"},{"id":"699de430ad0808777d11b82a","cells":[{"id":"699de430ad0808777d11b822","value":"Cu"},{"id":"699de430ad0808777d11b823","value":"SM"},{"id":"699de430ad0808777d11b824","value":"0,0754"},{"id":"699de430ad0808777d11b825","value":"2,2"},{"id":"699de430ad0808777d11b826","value":"2,8"},{"id":"699de430ad0808777d11b827","value":"12xD"},{"id":"699de430ad0808777d11b828","value":"56"},{"id":"699de430ad0808777d11b829","value":"9950"}],"configuration":"3x240/120"},{"id":"699de430ad0808777d11b833","cells":[{"id":"699de430ad0808777d11b82b","value":"Cu"},{"id":"699de430ad0808777d11b82c","value":"RE"},{"id":"699de430ad0808777d11b82d","value":"1,83"},{"id":"699de430ad0808777d11b82e","value":"1"},{"id":"699de430ad0808777d11b82f","value":"1,8"},{"id":"699de430ad0808777d11b830","value":"12xD"},{"id":"699de430ad0808777d11b831","value":"21"},{"id":"699de430ad0808777d11b832","value":"903"}],"configuration":"4x10/10"},{"id":"699de430ad0808777d11b83c","cells":[{"id":"699de430ad0808777d11b834","value":"Cu"},{"id":"699de430ad0808777d11b835","value":"RE"},{"id":"699de430ad0808777d11b836","value":"1,15"},{"id":"699de430ad0808777d11b837","value":"1"},{"id":"699de430ad0808777d11b838","value":"1,8"},{"id":"699de430ad0808777d11b839","value":"12xD"},{"id":"699de430ad0808777d11b83a","value":"24"},{"id":"699de430ad0808777d11b83b","value":"1237"}],"configuration":"4x16/16"},{"id":"699de430ad0808777d11b845","cells":[{"id":"699de430ad0808777d11b83d","value":"Cu"},{"id":"699de430ad0808777d11b83e","value":"RMV"},{"id":"699de430ad0808777d11b83f","value":"0,727"},{"id":"699de430ad0808777d11b840","value":"1,2"},{"id":"699de430ad0808777d11b841","value":"1,8"},{"id":"699de430ad0808777d11b842","value":"12xD"},{"id":"699de430ad0808777d11b843","value":"28"},{"id":"699de430ad0808777d11b844","value":"1801"}],"configuration":"4x25/16"},{"id":"699de430ad0808777d11b84e","cells":[{"id":"699de430ad0808777d11b846","value":"Cu"},{"id":"699de430ad0808777d11b847","value":"RMV"},{"id":"699de430ad0808777d11b848","value":"0,727"},{"id":"699de430ad0808777d11b849","value":"1,2"},{"id":"699de430ad0808777d11b84a","value":"1,8"},{"id":"699de430ad0808777d11b84b","value":"12xD"},{"id":"699de430ad0808777d11b84c","value":"28"},{"id":"699de430ad0808777d11b84d","value":"1886"}],"configuration":"4x25/25"},{"id":"699de430ad0808777d11b857","cells":[{"id":"699de430ad0808777d11b84f","value":"Cu"},{"id":"699de430ad0808777d11b850","value":"SM"},{"id":"699de430ad0808777d11b851","value":"0,524"},{"id":"699de430ad0808777d11b852","value":"1,2"},{"id":"699de430ad0808777d11b853","value":"1,8"},{"id":"699de430ad0808777d11b854","value":"12xD"},{"id":"699de430ad0808777d11b855","value":"28"},{"id":"699de430ad0808777d11b856","value":"2156"}],"configuration":"4x35/16"},{"id":"699de430ad0808777d11b860","cells":[{"id":"699de430ad0808777d11b858","value":"Cu"},{"id":"699de430ad0808777d11b859","value":"SM"},{"id":"699de430ad0808777d11b85a","value":"0,524"},{"id":"699de430ad0808777d11b85b","value":"1,2"},{"id":"699de430ad0808777d11b85c","value":"1,8"},{"id":"699de430ad0808777d11b85d","value":"12xD"},{"id":"699de430ad0808777d11b85e","value":"28"},{"id":"699de430ad0808777d11b85f","value":"2333"}],"configuration":"4x35/35"},{"id":"699de430ad0808777d11b869","cells":[{"id":"699de430ad0808777d11b861","value":"Cu"},{"id":"699de430ad0808777d11b862","value":"SM"},{"id":"699de430ad0808777d11b863","value":"0,387"},{"id":"699de430ad0808777d11b864","value":"1,4"},{"id":"699de430ad0808777d11b865","value":"2"},{"id":"699de430ad0808777d11b866","value":"12xD"},{"id":"699de430ad0808777d11b867","value":"33"},{"id":"699de430ad0808777d11b868","value":"2944"}],"configuration":"4x50/25"},{"id":"699de430ad0808777d11b872","cells":[{"id":"699de430ad0808777d11b86a","value":"Cu"},{"id":"699de430ad0808777d11b86b","value":"SM"},{"id":"699de430ad0808777d11b86c","value":"0,387"},{"id":"699de430ad0808777d11b86d","value":"1,4"},{"id":"699de430ad0808777d11b86e","value":"2"},{"id":"699de430ad0808777d11b86f","value":"12xD"},{"id":"699de430ad0808777d11b870","value":"34"},{"id":"699de430ad0808777d11b871","value":"3171"}],"configuration":"4x50/50"},{"id":"699de430ad0808777d11b87b","cells":[{"id":"699de430ad0808777d11b873","value":"Cu"},{"id":"699de430ad0808777d11b874","value":"SM"},{"id":"699de430ad0808777d11b875","value":"0,268"},{"id":"699de430ad0808777d11b876","value":"1,4"},{"id":"699de430ad0808777d11b877","value":"2,1"},{"id":"699de430ad0808777d11b878","value":"12xD"},{"id":"699de430ad0808777d11b879","value":"36"},{"id":"699de430ad0808777d11b87a","value":"3932"}],"configuration":"4x70/35"},{"id":"699de430ad0808777d11b884","cells":[{"id":"699de430ad0808777d11b87c","value":"Cu"},{"id":"699de430ad0808777d11b87d","value":"SM"},{"id":"699de430ad0808777d11b87e","value":"0,268"},{"id":"699de430ad0808777d11b87f","value":"1,4"},{"id":"699de430ad0808777d11b880","value":"2,1"},{"id":"699de430ad0808777d11b881","value":"12xD"},{"id":"699de430ad0808777d11b882","value":"37"},{"id":"699de430ad0808777d11b883","value":"4277"}],"configuration":"4x70/70"},{"id":"699de430ad0808777d11b88d","cells":[{"id":"699de430ad0808777d11b885","value":"Cu"},{"id":"699de430ad0808777d11b886","value":"SM"},{"id":"699de430ad0808777d11b887","value":"0,193"},{"id":"699de430ad0808777d11b888","value":"1,6"},{"id":"699de430ad0808777d11b889","value":"2,3"},{"id":"699de430ad0808777d11b88a","value":"12xD"},{"id":"699de430ad0808777d11b88b","value":"42"},{"id":"699de430ad0808777d11b88c","value":"5276"}],"configuration":"4x95/50"},{"id":"699de430ad0808777d11b896","cells":[{"id":"699de430ad0808777d11b88e","value":"Cu"},{"id":"699de430ad0808777d11b88f","value":"SM"},{"id":"699de430ad0808777d11b890","value":"0,193"},{"id":"699de430ad0808777d11b891","value":"1,6"},{"id":"699de430ad0808777d11b892","value":"2,3"},{"id":"699de430ad0808777d11b893","value":"12xD"},{"id":"699de430ad0808777d11b894","value":"42"},{"id":"699de430ad0808777d11b895","value":"5488"}],"configuration":"4x95/70"},{"id":"699de430ad0808777d11b89f","cells":[{"id":"699de430ad0808777d11b897","value":"Cu"},{"id":"699de430ad0808777d11b898","value":"SM"},{"id":"699de430ad0808777d11b899","value":"0,193"},{"id":"699de430ad0808777d11b89a","value":"1,6"},{"id":"699de430ad0808777d11b89b","value":"2,3"},{"id":"699de430ad0808777d11b89c","value":"12xD"},{"id":"699de430ad0808777d11b89d","value":"42"},{"id":"699de430ad0808777d11b89e","value":"5740"}],"configuration":"4x95/95"},{"id":"699de430ad0808777d11b8a8","cells":[{"id":"699de430ad0808777d11b8a0","value":"Cu"},{"id":"699de430ad0808777d11b8a1","value":"SM"},{"id":"699de430ad0808777d11b8a2","value":"0,153"},{"id":"699de430ad0808777d11b8a3","value":"1,6"},{"id":"699de430ad0808777d11b8a4","value":"2,4"},{"id":"699de430ad0808777d11b8a5","value":"12xD"},{"id":"699de430ad0808777d11b8a6","value":"46"},{"id":"699de430ad0808777d11b8a7","value":"6571"}],"configuration":"4x120/70"},{"id":"699de430ad0808777d11b8b1","cells":[{"id":"699de430ad0808777d11b8a9","value":"Cu"},{"id":"699de430ad0808777d11b8aa","value":"SM"},{"id":"699de430ad0808777d11b8ab","value":"0,153"},{"id":"699de430ad0808777d11b8ac","value":"1,6"},{"id":"699de430ad0808777d11b8ad","value":"2,4"},{"id":"699de430ad0808777d11b8ae","value":"12xD"},{"id":"699de430ad0808777d11b8af","value":"46"},{"id":"699de430ad0808777d11b8b0","value":"7077"}],"configuration":"4x120/120"},{"id":"699de430ad0808777d11b8ba","cells":[{"id":"699de430ad0808777d11b8b2","value":"Cu"},{"id":"699de430ad0808777d11b8b3","value":"SM"},{"id":"699de430ad0808777d11b8b4","value":"0,124"},{"id":"699de430ad0808777d11b8b5","value":"1,8"},{"id":"699de430ad0808777d11b8b6","value":"2,6"},{"id":"699de430ad0808777d11b8b7","value":"12xD"},{"id":"699de430ad0808777d11b8b8","value":"51"},{"id":"699de430ad0808777d11b8b9","value":"7883"}],"configuration":"4x150/70"},{"id":"699de430ad0808777d11b8c3","cells":[{"id":"699de430ad0808777d11b8bb","value":"Cu"},{"id":"699de430ad0808777d11b8bc","value":"SM"},{"id":"699de430ad0808777d11b8bd","value":"0,0991"},{"id":"699de430ad0808777d11b8be","value":"2"},{"id":"699de430ad0808777d11b8bf","value":"2,8"},{"id":"699de430ad0808777d11b8c0","value":"12xD"},{"id":"699de430ad0808777d11b8c1","value":"56"},{"id":"699de430ad0808777d11b8c2","value":"9892"}],"configuration":"4x185/95"},{"id":"699de430ad0808777d11b8cc","cells":[{"id":"699de430ad0808777d11b8c4","value":"Cu"},{"id":"699de430ad0808777d11b8c5","value":"SM"},{"id":"699de430ad0808777d11b8c6","value":"0,0991"},{"id":"699de430ad0808777d11b8c7","value":"2"},{"id":"699de430ad0808777d11b8c8","value":"2,8"},{"id":"699de430ad0808777d11b8c9","value":"12xD"},{"id":"699de430ad0808777d11b8ca","value":"57"},{"id":"699de430ad0808777d11b8cb","value":"10813"}],"configuration":"4x185/185"},{"id":"699de430ad0808777d11b8d5","cells":[{"id":"699de430ad0808777d11b8cd","value":"Cu"},{"id":"699de430ad0808777d11b8ce","value":"SM"},{"id":"699de430ad0808777d11b8cf","value":"0,0754"},{"id":"699de430ad0808777d11b8d0","value":"2,2"},{"id":"699de430ad0808777d11b8d1","value":"3"},{"id":"699de430ad0808777d11b8d2","value":"12xD"},{"id":"699de430ad0808777d11b8d3","value":"62"},{"id":"699de430ad0808777d11b8d4","value":"12658"}],"configuration":"4x240/120"}],"columns":[{"id":"699de430ad0808777d11b754","key":"Cond","label":"Leiter"},{"id":"699de430ad0808777d11b755","key":"shape","label":"Form"},{"id":"699de430ad0808777d11b756","key":"RI","label":"RI [Ohm/km]"},{"id":"699de430ad0808777d11b757","key":"Wi","label":"Wi [mm]"},{"id":"699de430ad0808777d11b758","key":"Wm","label":"Wm [mm]"},{"id":"699de430ad0808777d11b759","key":"Rbv","label":"Rbv [mm]"},{"id":"699de430ad0808777d11b75a","key":"Ø","label":"Ø [mm]"},{"id":"699de430ad0808777d11b75b","key":"G","label":"G [kg/km]"}],"metaItems":[{"id":"699de430ad0808777d11b74b","label":"Spannung","value":"0.6/1 kV"},{"id":"699de430ad0808777d11b74c","unit":"kV","label":"Prüfspannung","value":"4"},{"id":"699de430ad0808777d11b74d","unit":"°C","label":"Temperaturbereich","value":"-35-+70"},{"id":"699de430ad0808777d11b74e","unit":"°C","label":"Leitertemperatur (max.)","value":"70"},{"id":"699de430ad0808777d11b74f","unit":"°C","label":"Kurzschlusstemperatur (max.)","value":"160"},{"id":"699de430ad0808777d11b750","unit":"°C","label":"Minimale Verlegetemperatur","value":"-5"},{"id":"699de430ad0808777d11b751","unit":"°C","label":"Minimale Lagertemperatur","value":"-35"},{"id":"699de430ad0808777d11b752","unit":"","label":"CPR-Klasse","value":"Eca"},{"id":"699de430ad0808777d11b753","unit":"","label":"Flammhemmend","value":"IEC 60332-1-2"}],"voltageLabel":"0.6/1 kV"}],"technicalItems":[{"id":"699de430ad0808777d11b741","unit":"mm","label":"Biegeradius (mm)","value":"15/12xD"},{"id":"699de430ad0808777d11b742","unit":"","label":"CPR class","value":"Eca"},{"id":"699de430ad0808777d11b743","unit":"°C","label":"Maximal operating conductor temperature (°C)","value":"70"},{"id":"699de430ad0808777d11b744","unit":"°C","label":"Maximal short-circuit temperature (°C)","value":"160"},{"id":"699de430ad0808777d11b745","unit":"°C","label":"Minimal storage temperature (°C)","value":"-35"},{"id":"699de430ad0808777d11b746","unit":"°C","label":"Minimal temperature for laying (°C)","value":"-5"},{"id":"699de430ad0808777d11b747","unit":"kV","label":"Nennspannung (kV)","value":"0.6/1"},{"id":"699de430ad0808777d11b748","unit":"kV","label":"Prüfspannung (kV)","value":"4"},{"id":"699de430ad0808777d11b749","unit":"","label":"Self-extinguishing of single cable","value":"IEC 60332-1-2"},{"id":"699de430ad0808777d11b74a","unit":"°C","label":"Temperaturbereich (°C)","value":"-35-+70"}],"id":"69f85c4f31a177188da0eb25"}} />

