---
title: 'Focus on wind farm construction: three typical cable challenges'
date: '2025-11-05T10:16:15'
featuredImage: /uploads/2025/04/image_fx_-2025-02-20T193520.620.webp
locale: en
category: Kabel Technologie
---
# Focus on wind farm construction: three typical cable challenges

Building an [**onshore wind farm**](https://www.verivox.de/strom/themen/windpark/) is a technical masterpiece – and **cable installation** plays a crucial role. Between wind turbines, transformers and grid connection points run hundreds of meters of [**medium-voltage cables**](https://www.dosensecable.es/de/diferencia-entre-cable-de-media-tension/) that transfer the generated energy safely and efficiently to the grid. But it’s exactly these **wind farm cables** that often become the most critical bottleneck in the entire project.

**Wind power cabling** is far more than just sourcing materials. It requires precise planning, coordination and experience – from choosing the right **cable type** to ensuring timely delivery to the construction site. Even small delays or changes in plans can significantly affect progress and trigger high additional costs.

Add to this the logistical challenges: **large cable drums**, different [**conductor cross sections**](https://www.conrad.de/de/ratgeber/handwerk/kabelquerschnitt-berechnen.html), special **packaging**, and ever-changing construction site conditions. Without forward planning, you risk bottlenecks – and that can delay the entire [**grid connection of the wind farm**](https://www.enargus.de/pub/bscw.cgi/d7842-2/*/*/Netzanschluss%20einer%20Windkraftanlage?op=Wiki.getwiki&amp;search=Windpark).

In this article, we look at the** 3 biggest challenges in wind farm construction** – and show how proactive logistics and the right cable strategy can help you stay on schedule and maximize efficiency.

Find out why onshore wind farms are a crucial pillar of the energy transition here:

<div>[](https://www.enbw.com/unternehmen/themen/windkraft/onshore-wind-pfeiler-der-energiewende.html)<div><div><img decoding="async" src="https://www.enbw.com/media/image-proxy/1600x914,q70,focus50x49,zoom1.0/https://www.enbw.com/media/presse/images/newsroom/onshore-windpark-langenburg-7zu4_1701415033580.jpg" style={{"maxWidth":"150px","maxHeight":"150px"}} /></div></div><div><div>Onshore-Windenergie als Pfeiler der Energiewende | EnBW</div><div>Viele Faktoren haben den Bau von Windenergieanlagen in den letzten Jahren gebremst. Lesen Sie hier die Gründe!</div></div></div>

## Challenge 1: Tight construction timelines and fixed deadlines
In **wind farm construction**, schedules are rarely flexible. Any delay in [**cable laying**](https://www.eef.de/news/die-infrastruktur-hinter-windparks) directly impacts the entire build process – from foundation and tower installation to commissioning. Since **grid connection deadlines** are usually contractually binding, a missing [**medium-voltage cable**](/de/stromkabel/mittelspannungskabel/) can quickly lead to costly site downtime.

Typical causes of delays:

<li>
delayed **cable deliveries** or unclear scheduling

</li>
<li>
inaccurate **material planning** in large-scale projects

</li>
<li>
weather conditions delaying [**underground cable installation**](https://www.eww.at/magazin/beitraege/detail/erdkabel-sichere-stromversorgung)

</li>
<li>
lack of coordination between suppliers, civil engineers and installers

</li>

Especially for **wind farm projects** involving several kilometers of [**NA2XS(F)2Y**](/de/produkte/stromkabel/mittelspannungskabel/na2xsf2y-2/), precise **delivery coordination** is essential. Partial and complete deliveries must be scheduled to match the actual **construction progress**.

**Efficient logistics solutions can make the difference:**

<table>
<thead>
<tr>
<th>Challenge</th>
<th>Solution</th>
</tr>
</thead>
<tbody>
<tr>
<td>Different construction progress per turbine</td>
<td>Partial and phased deliveries matched to the build schedule</td>
</tr>
<tr>
<td>Tight installation windows</td>
<td>Just-in-time cable delivery to site</td>
</tr>
<tr>
<td>Limited storage space on site</td>
<td>Temporary, project-specific intermediate storage</td>
</tr>
<tr>
<td>Weather-dependent operations</td>
<td>Flexible adjustment of delivery schedules and material allocation</td>
</tr>
</tbody>
</table>
With precise [**cable capacity**](https://www.a-eberle.de/infobrief/infobrief-20/) planning and responsive logistics, even high-pressure timelines can be handled efficiently. This ensures the **wind farm’s grid connection** stays on schedule – and energy flows reliably.

Want to know which cable types are used in wind farms? Check out this article:

<div>[](https://wind-turbine.com/magazin/ratgeber/250713/welche-arten-von-kabeln-benoetigt-man-fuer-den-bau-eines-windparks.html)<div><div><img decoding="async" src="https://wind-turbine.com/i/53689/68738caa5e58ffdf06031cf2/2/1200/630/68738c85497af_KabelfreinenWindparkpng.png" style={{"maxWidth":"150px","maxHeight":"150px"}} /></div></div><div><div>Welche Arten von Kabeln benötigt man für den Bau eines Windparks?</div><div>Die Verkabelung ist ein zentrales Element jeder Windkraftanlage und beeinflusst maßgeblich die Effizienz, Sicherheit und Wirtschaftlichkeit eines Windparks.…</div></div></div>

## Challenge 2: Large delivery volumes and specialized packaging
A modern **onshore wind farm** requires several kilometers of **medium-voltage cables** – often of the type [**NA2XS(F)2Y**](/de/produkte/stromkabel/mittelspannungskabel/na2xsf2y-2/), [**N2XSY**](/de/produkte/stromkabel/mittelspannungskabel/n2xsy-2/) or [**NAYY**](/de/produkte/stromkabel/niederspannungskabel/nayy-2/). These cables weigh several tons per drum and require smart logistics to avoid damage, confusion and costly delays.

The bigger the project, the more complex the **material coordination** becomes:

<li>
Different **cable cross-sections** and **conductor types** must be clearly assigned.

</li>
<li>
**Drum sizes** and [**installation units**](https://www.elektrofachkraft.de/sicheres-arbeiten/neue-mindestanforderungen-fuer-kabelverlegung) vary by cable length and location.

</li>
<li>
Clear **markings** and **packaging systems** on-site are key to avoid installation mistakes.

</li>

**Our experience shows:** Planning for storage and packaging units in advance not only saves time but also reduces the risk of material loss and reorders.

**Typical requirements and solutions:**

<table>
<thead>
<tr>
<th>Challenge</th>
<th>Practical solution</th>
</tr>
</thead>
<tbody>
<tr>
<td>High delivery volumes on tight site space</td>
<td>Project-specific storage in regional hubs</td>
</tr>
<tr>
<td>Different drum sizes for medium- and low-voltage</td>
<td>Adjust drum dimensions to pulling force and weight</td>
</tr>
<tr>
<td>Sensitive cable sheaths when stored outdoors</td>
<td>Weatherproof packaging and UV protection</td>
</tr>
<tr>
<td>Lack of overview with many cable deliveries</td>
<td>Digital delivery summaries and clear drum labeling</td>
</tr>
</tbody>
</table>
A clear [**cable logistics strategy**](https://logistik-heute.de/galerien/mammutprojekt-kabellogistik-wie-kommen-tausende-tonnen-hgue-erdkabel-fuer-die-energiewende-zum-einsatzort-40875.html) is the key to avoiding material shortages and costly downtime. This helps maintain control – even for projects involving dozens of kilometers of **wind farm cabling**.

Anyone who integrates **packaging, storage and labeling** early into the planning process ensures that the **wind farm cables** arrive exactly where they&#8217;re needed – with no time lost and no disruption to the construction flow.

## Challenge 3: Last-minute project changes
Hardly any **wind farm project** goes exactly to plan. Construction site conditions, supply bottlenecks, or new requirements from the [grid operator](https://windpark-altdorferwald.de/wissenswertes-windenergie/wie-wird-die-erzeugte-energie-ins-stromnetz-eingespeist/) often lead to spontaneous adjustments – and this is where the true flexibility of **cable logistics** is revealed.

**Typical scenarios:**

<li>
A cable route has to be changed due to geological conditions.

</li>
<li>
**Cable types** or **conductor cross-sections** change after a new grid calculation.

</li>
<li>
The **delivery location** changes at short notice because sections progress faster or slower than expected.

</li>

In such cases, it’s crucial that the supplier has **its own stock** and a **quick response time**. Only then can changes to **cable lengths** or additional **earthing components** be provided promptly, without delaying the project.

An experienced partner can make all the difference:

<li>
**Rapid re-delivery** from central stock within Germany

</li>
<li>
**Flexible redirection** of deliveries in case of planning changes

</li>
<li>
**Close coordination** with project managers, civil engineers and installation teams

</li>
<li>
**Documented traceability** to keep all changes transparent

</li>

Short-term changes aren’t the exception – they’re part of everyday life in **wind farm construction**. What matters is being prepared. A well-designed [**supply chain**](https://bwo-offshorewind.de/pressemitteilung-roadmap-ist-wichtiger-schritt-fuer-resiliente-lieferketten/), clear communication, and agile warehousing structures ensure the project stays on schedule – and the wind farm connects to the grid on time.

Avoid delays or issues during your wind power project by understanding early on why NABU may file objections to certain sites:

<div>[](https://www.nabu.de/umwelt-und-ressourcen/energie/erneuerbare-energien-energiewende/windenergie/26913.html)<div><div><img decoding="async" src="https://www.nabu.de/imperia/md/nabu/images/umwelt/energie/energietraeger/windkraft/161125-nabu-windrad-allgaeu-heidrun-burchard.jpeg" style={{"maxWidth":"150px","maxHeight":"150px"}} /></div></div><div><div>Wann klagt der NABU gegen Windkraftprojekte?</div><div>45 Klagen wurden wegen Fehlplanungen bei Windenergie zwischen 2010 und 2019 vom NABU auf den Weg gebracht. Nicht weil der Windenergieausbau aufgehalten werden soll, sondern weil immer wieder Vorhaben und Planungen eklatant gegen Naturschutzrecht verstoßen.</div></div></div>

## Quality and sustainability as success factors
In addition to time and logistics, [**cable quality**](https://www.windkraft-journal.de/2025/07/14/planungsempfehlung-bei-der-verkabelung-von-windparks-durch-wind-turbine-com/) plays a decisive role in the long-term performance of a **wind farm**. After all, the installed **[medium-voltage](/de/stromkabel/mittelspannungskabel/) and [high-voltage cables](/de/stromkabel/hochspannungskabel/)** are expected to transmit energy reliably for decades – even under extreme weather and changing load conditions.

A high-quality **cable system for wind power** stands out due to several factors:

<li>
**Material quality:** XLPE-insulated cables like [**NA2XS(F)2Y**](/de/produkte/stromkabel/mittelspannungskabel/na2xsf2y-2/) or [**N2XS(F)2Y**](/de/produkte/stromkabel/mittelspannungskabel/n2xsf2y-2/) provide high dielectric strength and excellent long-term protection.

</li>
<li>
**[Standards compliance](https://www.zvei.org/fileadmin/user_upload/Presse_und_Medien/Publikationen/2017/September/ZVEI_Leitfaden_Kabel_und_Leitungen_in_Windkraftanlagen/ZVEI-Leitfaden-Kabel-und-Leitungen-in-Windkraftanlagen-September-2017.pdf):** All components used should meet key standards such as **DIN VDE 0276**, **VDE 0298**, or **IEC 60502**.

</li>
<li>
**Ease of installation:** Cable design must allow for efficient and safe installation – even under difficult ground conditions.

</li>
<li>
**Environmental aspects:** Recyclable materials and the [reuse of drums or conductor materials](/de/recycling-von-kabeltrommeln-nachhaltigkeit-im-windkraftprojekt/) help reduce ecological footprint.

</li>

More and more project developers are placing value on **sustainable cable systems** that combine energy efficiency with durability. This applies not only to the **material selection**, but also to **supply chains**: short transport routes, local storage near the project, and optimized packaging concepts reduce emissions and logistics effort.

The combination of **technical quality**, **ecological responsibility**, and **efficient logistics** makes modern **wind farm cabling** a central success factor for grid expansion. Anyone who invests in smart solutions here builds the foundation for stable and sustainable energy flow – now and in the future.

[Find out here which cables are suitable for your wind farm project and what makes the difference between low and high voltage options.](/de/welche-kabel-fuer-windkraft-unterschiede-von-nieder-bis-hoechstspannung-erklaert/)

## Conclusion: Successfully connected to the grid
Cabling is the backbone of any **wind farm** – and at the same time one of the most sensitive parts of the project. Tight schedules, complex logistics and last-minute changes aren’t the exception, they’re the norm. Those who identify and address these challenges early avoid standstills, cost overruns and missed deadlines.

Successful **wind farm cable projects** rely on three core principles:

<ol>
<li>
**Structured planning** – clear workflows, coordinated delivery schedules and defined responsibilities.

</li>
<li>
**Flexibility** – in-house stock and short response times when changes occur.

</li>
<li>
**Quality** – durable, standards-compliant cable systems and sustainable logistics processes.

</li>
</ol>
With the right mix of experience, organization and technical know-how, even complex **wind farm cabling** can be implemented efficiently. This keeps construction on track – and ensures the wind farm delivers power exactly when it’s needed.

<h3>KLZ – your partner for successful wind farm cabling</h3>
Whether you need [**medium voltage**](/de/stromkabel/mittelspannungskabel/), **underground cables**, or complete **grid connection solutions** – we don’t just provide the right materials, but the kind of experience that actually moves your project forward. For years, we’ve been supporting **wind power projects** throughout Germany and the Netherlands – from technical consulting and **material selection** to **on-time delivery**.

Our advantage? **Real-world experience**: We know how tight construction timelines in wind projects are, which cable systems have proven themselves, and what really matters in logistics. Thanks to our **central storage facilities in Germany**, we respond quickly to changes and keep supply chains stable – even when your project gets dynamic.

With our network, market knowledge, and passion for renewable energy, we ensure your **wind power project** connects to the grid on time – and without the drama.

➡️ **Planning a new wind farm or need help choosing the right cables?** Then talk to us – we deliver the **cables, solutions, and expertise** that make your project a success.

[Get in touch now](/de/kontakt/)

