import { ImageResponse } from 'next/og';
import { getTranslations } from 'next-intl/server';
import { OGImageTemplate } from '@/components/OGImageTemplate';

export const runtime = 'edge';

export default async function Image({ params: { locale } }: { params: { locale: string } }) {
  const t = await getTranslations({ locale, namespace: 'Index.meta' });

  return new ImageResponse(
    (
      <OGImageTemplate
        title={t('title')}
        description={t('description')}
        label="Reliable Energy Infrastructure"
      />
    ),
    {
      width: 1200,
      height: 630,
    }
  );
}
