---
title: 'Focus on wind farm construction: three typical cable challenges'
date: '2025-11-05T10:16:15'
featuredImage: /uploads/2025/04/image_fx_-2025-02-20T193520.620.webp
locale: en
---
# Focus on wind farm construction: three typical cable challenges

<p data-start="72" data-end="471">Building an <a href="https://www.verivox.de/strom/themen/windpark/" target="_blank" rel="noopener noreferrer nofollow"><strong data-start="86" data-end="107">onshore wind farm</strong></a> is a technical masterpiece – and <strong data-start="154" data-end="169">cable installation</strong> plays a crucial role. Between wind turbines, transformers and grid connection points run hundreds of meters of <a href="https://www.dosensecable.es/de/diferencia-entre-cable-de-media-tension/" target="_blank" rel="noopener noreferrer nofollow"><strong data-start="288" data-end="312">medium-voltage cables</strong></a> that transfer the generated energy safely and efficiently to the grid. But it’s exactly these <strong data-start="399" data-end="417">wind farm cables</strong> that often become the most critical bottleneck in the entire project.</p>
<p data-start="473" data-end="834"><strong data-start="477" data-end="501">Wind power cabling</strong> is far more than just sourcing materials. It requires precise planning, coordination and experience – from choosing the right <strong data-start="635" data-end="648">cable type</strong> to ensuring timely delivery to the construction site. Even small delays or changes in plans can significantly affect progress and trigger high additional costs.</p>
<p data-start="836" data-end="1129">Add to this the logistical challenges: <strong data-start="880" data-end="903">large cable drums</strong>, different <a href="https://www.conrad.de/de/ratgeber/handwerk/kabelquerschnitt-berechnen.html" target="_blank" rel="noopener noreferrer nofollow"><strong data-start="922" data-end="944">conductor cross sections</strong></a>, special <strong data-start="956" data-end="972">packaging</strong>, and ever-changing construction site conditions. Without forward planning, you risk bottlenecks – and that can delay the entire <a href="https://www.enargus.de/pub/bscw.cgi/d7842-2/*/*/Netzanschluss%20einer%20Windkraftanlage?op=Wiki.getwiki&amp;search=Windpark" target="_blank" rel="noopener noreferrer nofollow"><strong data-start="1085" data-end="1116">grid connection of the wind farm</strong></a>.</p>
<p data-start="1131" data-end="1351" data-is-last-node="" data-is-only-node="">In this article, we look at the<strong data-start="1168" data-end="1215"> 3 biggest challenges in wind farm construction</strong> – and show how proactive logistics and the right cable strategy can help you stay on schedule and maximize efficiency.</p>
<p data-start="1131" data-end="1351" data-is-last-node="" data-is-only-node="">Find out why onshore wind farms are a crucial pillar of the energy transition here:</p>
<div class="vlp-link-container vlp-layout-basic"><a href="https://www.enbw.com/unternehmen/themen/windkraft/onshore-wind-pfeiler-der-energiewende.html" class="vlp-link" title="Onshore-Windenergie als Pfeiler der Energiewende | EnBW" rel="nofollow" target="_blank"></a><div class="vlp-layout-zone-side"><div class="vlp-block-2 vlp-link-image"><img decoding="async" src="https://www.enbw.com/media/image-proxy/1600x914,q70,focus50x49,zoom1.0/https://www.enbw.com/media/presse/images/newsroom/onshore-windpark-langenburg-7zu4_1701415033580.jpg" style={{"maxWidth":"150px","maxHeight":"150px"}} /></div></div><div class="vlp-layout-zone-main"><div class="vlp-block-0 vlp-link-title">Onshore-Windenergie als Pfeiler der Energiewende | EnBW</div><div class="vlp-block-1 vlp-link-summary">Viele Faktoren haben den Bau von Windenergieanlagen in den letzten Jahren gebremst. Lesen Sie hier die Gründe!</div></div></div>

<h2 data-start="975" data-end="1032">Challenge 1: Tight construction timelines and fixed deadlines</h2>
<p data-start="40" data-end="405">In <strong data-start="43" data-end="58">wind farm construction</strong>, schedules are rarely flexible. Any delay in <a href="https://www.eef.de/news/die-infrastruktur-hinter-windparks" target="_blank" rel="noopener noreferrer nofollow"><strong data-start="116" data-end="134">cable laying</strong></a> directly impacts the entire build process – from foundation and tower installation to commissioning. Since <strong data-start="257" data-end="281">grid connection deadlines</strong> are usually contractually binding, a missing <a href="/de/stromkabel/mittelspannungskabel/"><strong data-start="336" data-end="360">medium-voltage cable</strong></a> can quickly lead to costly site downtime.</p>
<p data-start="407" data-end="445">Typical causes of delays:</p>
<ul data-start="446" data-end="697">
<li data-start="446" data-end="511">
<p data-start="448" data-end="511">delayed <strong data-start="459" data-end="479">cable deliveries</strong> or unclear scheduling</p>
</li>
<li data-start="512" data-end="570">
<p data-start="514" data-end="570">inaccurate <strong data-start="524" data-end="547">material planning</strong> in large-scale projects</p>
</li>
<li data-start="571" data-end="631">
<p data-start="573" data-end="631">weather conditions delaying <a href="https://www.eww.at/magazin/beitraege/detail/erdkabel-sichere-stromversorgung" target="_blank" rel="noopener noreferrer nofollow"><strong data-start="602" data-end="619">underground cable installation</strong></a></p>
</li>
<li data-start="632" data-end="697">
<p data-start="634" data-end="697">lack of coordination between suppliers, civil engineers and installers</p>
</li>
</ul>
<p data-start="699" data-end="967">Especially for <strong data-start="710" data-end="731">wind farm projects</strong> involving several kilometers of <a href="/de/produkte/stromkabel/mittelspannungskabel/na2xsf2y-2/"><strong data-start="756" data-end="770">NA2XS(F)2Y</strong></a>, precise <strong data-start="811" data-end="833">delivery coordination</strong> is essential. Partial and complete deliveries must be scheduled to match the actual <strong data-start="937" data-end="955">construction progress</strong>.</p>
<p data-start="969" data-end="1038"><strong data-start="969" data-end="1036">Efficient logistics solutions can make the difference:</strong></p>
<table class="w-fit min-w-(--thread-content-width)" data-start="1040" data-end="1453">
<thead>
<tr>
<th>Challenge</th>
<th>Solution</th>
</tr>
</thead>
<tbody>
<tr>
<td>Different construction progress per turbine</td>
<td>Partial and phased deliveries matched to the build schedule</td>
</tr>
<tr>
<td>Tight installation windows</td>
<td>Just-in-time cable delivery to site</td>
</tr>
<tr>
<td>Limited storage space on site</td>
<td>Temporary, project-specific intermediate storage</td>
</tr>
<tr>
<td>Weather-dependent operations</td>
<td>Flexible adjustment of delivery schedules and material allocation</td>
</tr>
</tbody>
</table>
<p data-start="1455" data-end="1694">With precise <a href="https://www.a-eberle.de/infobrief/infobrief-20/" target="_blank" rel="noopener noreferrer nofollow"><strong data-start="1486" data-end="1506">cable capacity</strong></a> planning and responsive logistics, even high-pressure timelines can be handled efficiently. This ensures the <strong data-start="1615" data-end="1646">wind farm’s grid connection</strong> stays on schedule – and energy flows reliably.</p>
<p data-start="1455" data-end="1694">Want to know which cable types are used in wind farms? Check out this article:</p>
<div class="vlp-link-container vlp-layout-basic"><a href="https://wind-turbine.com/magazin/ratgeber/250713/welche-arten-von-kabeln-benoetigt-man-fuer-den-bau-eines-windparks.html" class="vlp-link" title="Welche Arten von Kabeln benötigt man für den Bau eines Windparks?" rel="nofollow" target="_blank"></a><div class="vlp-layout-zone-side"><div class="vlp-block-2 vlp-link-image"><img decoding="async" src="https://wind-turbine.com/i/53689/68738caa5e58ffdf06031cf2/2/1200/630/68738c85497af_KabelfreinenWindparkpng.png" style={{"maxWidth":"150px","maxHeight":"150px"}} /></div></div><div class="vlp-layout-zone-main"><div class="vlp-block-0 vlp-link-title">Welche Arten von Kabeln benötigt man für den Bau eines Windparks?</div><div class="vlp-block-1 vlp-link-summary">Die Verkabelung ist ein zentrales Element jeder Windkraftanlage und beeinflusst maßgeblich die Effizienz, Sicherheit und Wirtschaftlichkeit eines Windparks.…</div></div></div>

<h2 data-start="2103" data-end="2157">Challenge 2: Large delivery volumes and specialized packaging</h2>
<p data-start="54" data-end="355">A modern <strong data-start="67" data-end="87">onshore wind farm</strong> requires several kilometers of <strong data-start="115" data-end="139">medium-voltage cables</strong> – often of the type <a href="/de/produkte/stromkabel/mittelspannungskabel/na2xsf2y-2/"><strong data-start="157" data-end="171">NA2XS(F)2Y</strong></a>, <a href="/de/produkte/stromkabel/mittelspannungskabel/n2xsy-2/"><strong data-start="173" data-end="182">N2XSY</strong></a> or <a href="/de/produkte/stromkabel/niederspannungskabel/nayy-2/"><strong data-start="188" data-end="196">NAYY</strong></a>. These cables weigh several tons per drum and require smart logistics to avoid damage, confusion and costly delays.</p>
<p data-start="357" data-end="432">The bigger the project, the more complex the <strong data-start="405" data-end="429">material coordination</strong> becomes:</p>
<ul data-start="433" data-end="747">
<li data-start="433" data-end="527">
<p data-start="435" data-end="527">Different <strong data-start="452" data-end="473">cable cross-sections</strong> and <strong data-start="478" data-end="493">conductor types</strong> must be clearly assigned.</p>
</li>
<li data-start="528" data-end="619">
<p data-start="530" data-end="619"><strong data-start="530" data-end="547">Drum sizes</strong> and <a href="https://www.elektrofachkraft.de/sicheres-arbeiten/neue-mindestanforderungen-fuer-kabelverlegung" target="_blank" rel="noopener noreferrer nofollow"><strong data-start="552" data-end="572">installation units</strong></a> vary by cable length and location.</p>
</li>
<li data-start="620" data-end="747">
<p data-start="622" data-end="747">Clear <strong data-start="651" data-end="670">markings</strong> and <strong data-start="675" data-end="697">packaging systems</strong> on-site are key to avoid installation mistakes.</p>
</li>
</ul>
<p data-start="749" data-end="941"><strong data-start="749" data-end="776">Our experience shows:</strong> Planning for storage and packaging units in advance not only saves time but also reduces the risk of material loss and reorders.</p>
<p data-start="943" data-end="990"><strong data-start="943" data-end="988">Typical requirements and solutions:</strong></p>
<table class="w-fit min-w-(--thread-content-width)" data-start="992" data-end="1533">
<thead>
<tr>
<th>Challenge</th>
<th>Practical solution</th>
</tr>
</thead>
<tbody>
<tr>
<td>High delivery volumes on tight site space</td>
<td>Project-specific storage in regional hubs</td>
</tr>
<tr>
<td>Different drum sizes for medium- and low-voltage</td>
<td>Adjust drum dimensions to pulling force and weight</td>
</tr>
<tr>
<td>Sensitive cable sheaths when stored outdoors</td>
<td>Weatherproof packaging and UV protection</td>
</tr>
<tr>
<td>Lack of overview with many cable deliveries</td>
<td>Digital delivery summaries and clear drum labeling</td>
</tr>
</tbody>
</table>
<p data-start="1535" data-end="1761">A clear <a href="https://logistik-heute.de/galerien/mammutprojekt-kabellogistik-wie-kommen-tausende-tonnen-hgue-erdkabel-fuer-die-energiewende-zum-einsatzort-40875.html" target="_blank" rel="noopener noreferrer nofollow"><strong data-start="1546" data-end="1572">cable logistics strategy</strong></a> is the key to avoiding material shortages and costly downtime. This helps maintain control – even for projects involving dozens of kilometers of <strong data-start="1735" data-end="1758">wind farm cabling</strong>.</p>
<p data-start="1763" data-end="1994">Anyone who integrates <strong data-start="1771" data-end="1813">packaging, storage and labeling</strong> early into the planning process ensures that the <strong data-start="1876" data-end="1894">wind farm cables</strong> arrive exactly where they&#8217;re needed – with no time lost and no disruption to the construction flow.</p>

<h2 data-start="3656" data-end="3710">Challenge 3: Last-minute project changes</h2>
<p data-start="45" data-end="287">Hardly any <strong data-start="54" data-end="73">wind farm project</strong> goes exactly to plan. Construction site conditions, supply bottlenecks, or new requirements from the <a href="https://windpark-altdorferwald.de/wissenswertes-windenergie/wie-wird-die-erzeugte-energie-ins-stromnetz-eingespeist/" target="_blank" rel="noopener noreferrer nofollow">grid operator</a> often lead to spontaneous adjustments – and this is where the true flexibility of <strong data-start="254" data-end="271">cable logistics</strong> is revealed.</p>
<p data-start="289" data-end="314"><strong data-start="289" data-end="312">Typical scenarios:</strong></p>
<ul data-start="315" data-end="588">
<li data-start="315" data-end="387">
<p data-start="317" data-end="387">A cable route has to be changed due to geological conditions.</p>
</li>
<li data-start="388" data-end="477">
<p data-start="390" data-end="477"><strong data-start="394" data-end="408">Cable types</strong> or <strong data-start="414" data-end="436">conductor cross-sections</strong> change after a new grid calculation.</p>
</li>
<li data-start="478" data-end="588">
<p data-start="480" data-end="588">The <strong data-start="484" data-end="497">delivery location</strong> changes at short notice because sections progress faster or slower than expected.</p>
</li>
</ul>
<p data-start="590" data-end="855">In such cases, it’s crucial that the supplier has <strong data-start="645" data-end="669">its own stock</strong> and a <strong data-start="679" data-end="702">quick response time</strong>. Only then can changes to <strong data-start="737" data-end="752">cable lengths</strong> or additional <strong data-start="770" data-end="792">earthing components</strong> be provided promptly, without delaying the project.</p>
<p data-start="857" data-end="915">An experienced partner can make all the difference:</p>
<ul data-start="916" data-end="1201">
<li data-start="916" data-end="988">
<p data-start="918" data-end="988"><strong data-start="918" data-end="944">Rapid re-delivery</strong> from central stock within Germany</p>
</li>
<li data-start="989" data-end="1048">
<p data-start="991" data-end="1048"><strong data-start="991" data-end="1013">Flexible redirection</strong> of deliveries in case of planning changes</p>
</li>
<li data-start="1049" data-end="1120">
<p data-start="1051" data-end="1120"><strong data-start="1051" data-end="1070">Close coordination</strong> with project managers, civil engineers and installation teams</p>
</li>
<li data-start="1121" data-end="1201">
<p data-start="1123" data-end="1201"><strong data-start="1123" data-end="1159">Documented traceability</strong> to keep all changes transparent</p>
</li>
</ul>
<p data-start="1203" data-end="1546">Short-term changes aren’t the exception – they’re part of everyday life in <strong data-start="1278" data-end="1293">wind farm construction</strong>. What matters is being prepared. A well-designed <a href="https://bwo-offshorewind.de/pressemitteilung-roadmap-ist-wichtiger-schritt-fuer-resiliente-lieferketten/" target="_blank" rel="noopener noreferrer nofollow"><strong data-start="1358" data-end="1373">supply chain</strong></a>, clear communication, and agile warehousing structures ensure the project stays on schedule – and the wind farm connects to the grid on time.</p>
<p data-start="1203" data-end="1546">Avoid delays or issues during your wind power project by understanding early on why NABU may file objections to certain sites:</p>
<div class="vlp-link-container vlp-layout-basic"><a href="https://www.nabu.de/umwelt-und-ressourcen/energie/erneuerbare-energien-energiewende/windenergie/26913.html" class="vlp-link" title="Wann klagt der NABU gegen Windkraftprojekte?" rel="nofollow" target="_blank"></a><div class="vlp-layout-zone-side"><div class="vlp-block-2 vlp-link-image"><img decoding="async" src="https://www.nabu.de/imperia/md/nabu/images/umwelt/energie/energietraeger/windkraft/161125-nabu-windrad-allgaeu-heidrun-burchard.jpeg" style={{"maxWidth":"150px","maxHeight":"150px"}} /></div></div><div class="vlp-layout-zone-main"><div class="vlp-block-0 vlp-link-title">Wann klagt der NABU gegen Windkraftprojekte?</div><div class="vlp-block-1 vlp-link-summary">45 Klagen wurden wegen Fehlplanungen bei Windenergie zwischen 2010 und 2019 vom NABU auf den Weg gebracht. Nicht weil der Windenergieausbau aufgehalten werden soll, sondern weil immer wieder Vorhaben und Planungen eklatant gegen Naturschutzrecht verstoßen.</div></div></div>

<h2 data-start="4835" data-end="4892">Quality and sustainability as success factors</h2>
<p data-start="56" data-end="396">In addition to time and logistics, <a href="https://www.windkraft-journal.de/2025/07/14/planungsempfehlung-bei-der-verkabelung-von-windparks-durch-wind-turbine-com/" target="_blank" rel="noopener noreferrer nofollow"><strong data-start="96" data-end="113">cable quality</strong></a> plays a decisive role in the long-term performance of a <strong data-start="178" data-end="191">wind farm</strong>. After all, the installed <strong data-start="230" data-end="273"><a href="/de/stromkabel/mittelspannungskabel/">medium-voltage</a> and <a href="/de/stromkabel/hochspannungskabel/">high-voltage cables</a></strong> are expected to transmit energy reliably for decades – even under extreme weather and changing load conditions.</p>
<p data-start="398" data-end="495">A high-quality <strong data-start="415" data-end="451">cable system for wind power</strong> stands out due to several factors:</p>
<ul data-start="496" data-end="1121">
<li data-start="496" data-end="646">
<p data-start="498" data-end="646"><strong data-start="498" data-end="519">Material quality:</strong> XLPE-insulated cables like <a href="/de/produkte/stromkabel/mittelspannungskabel/na2xsf2y-2/"><strong data-start="544" data-end="558">NA2XS(F)2Y</strong></a> or <a href="/de/produkte/stromkabel/mittelspannungskabel/n2xsf2y-2/"><strong data-start="564" data-end="577">N2XS(F)2Y</strong></a> provide high dielectric strength and excellent long-term protection.</p>
</li>
<li data-start="647" data-end="801">
<p data-start="649" data-end="801"><strong data-start="649" data-end="669"><a href="https://www.zvei.org/fileadmin/user_upload/Presse_und_Medien/Publikationen/2017/September/ZVEI_Leitfaden_Kabel_und_Leitungen_in_Windkraftanlagen/ZVEI-Leitfaden-Kabel-und-Leitungen-in-Windkraftanlagen-September-2017.pdf" target="_blank" rel="noopener noreferrer nofollow">Standards compliance</a>:</strong> All components used should meet key standards such as <strong data-start="737" data-end="753">DIN VDE 0276</strong>, <strong data-start="755" data-end="767">VDE 0298</strong>, or <strong data-start="773" data-end="786">IEC 60502</strong>.</p>
</li>
<li data-start="802" data-end="969">
<p data-start="804" data-end="969"><strong data-start="804" data-end="830">Ease of installation:</strong> Cable design must allow for efficient and safe installation – even under difficult ground conditions.</p>
</li>
<li data-start="970" data-end="1121">
<p data-start="972" data-end="1121"><strong data-start="972" data-end="990">Environmental aspects:</strong> Recyclable materials and the <a href="/de/recycling-von-kabeltrommeln-nachhaltigkeit-im-windkraftprojekt/">reuse of drums or conductor materials</a> help reduce ecological footprint.</p>
</li>
</ul>
<p data-start="1123" data-end="1464">More and more project developers are placing value on <strong data-start="1167" data-end="1195">sustainable cable systems</strong> that combine energy efficiency with durability. This applies not only to the <strong data-start="1286" data-end="1305">material selection</strong>, but also to <strong data-start="1324" data-end="1340">supply chains</strong>: short transport routes, local storage near the project, and optimized packaging concepts reduce emissions and logistics effort.</p>
<p data-start="1466" data-end="1789">The combination of <strong data-start="1486" data-end="1510">technical quality</strong>, <strong data-start="1512" data-end="1542">ecological responsibility</strong>, and <strong data-start="1547" data-end="1571">efficient logistics</strong> makes modern <strong data-start="1586" data-end="1609">wind farm cabling</strong> a central success factor for grid expansion. Anyone who invests in smart solutions here builds the foundation for stable and sustainable energy flow – now and in the future.</p>
<p data-start="1466" data-end="1789"><a href="/de/welche-kabel-fuer-windkraft-unterschiede-von-nieder-bis-hoechstspannung-erklaert/">Find out here which cables are suitable for your wind farm project and what makes the difference between low and high voltage options.</a></p>

<h2>Conclusion: Successfully connected to the grid</h2>
<p data-start="38" data-end="386">Cabling is the backbone of any <strong data-start="77" data-end="90">wind farm</strong> – and at the same time one of the most sensitive parts of the project. Tight schedules, complex logistics and last-minute changes aren’t the exception, they’re the norm. Those who identify and address these challenges early avoid standstills, cost overruns and missed deadlines.</p>
<p data-start="388" data-end="465">Successful <strong data-start="401" data-end="427">wind farm cable projects</strong> rely on three core principles:</p>
<ol data-start="466" data-end="755">
<li data-start="466" data-end="576">
<p data-start="469" data-end="576"><strong data-start="469" data-end="494">Structured planning</strong> – clear workflows, coordinated delivery schedules and defined responsibilities.</p>
</li>
<li data-start="577" data-end="663">
<p data-start="580" data-end="663"><strong data-start="580" data-end="596">Flexibility</strong> – in-house stock and short response times when changes occur.</p>
</li>
<li data-start="664" data-end="755">
<p data-start="667" data-end="755"><strong data-start="667" data-end="679">Quality</strong> – durable, standards-compliant cable systems and sustainable logistics processes.</p>
</li>
</ol>
<p data-start="757" data-end="1022">With the right mix of experience, organization and technical know-how, even complex <strong data-start="869" data-end="894">wind farm cabling</strong> can be implemented efficiently. This keeps construction on track – and ensures the wind farm delivers power exactly when it’s needed.</p>

<h3 data-start="0" data-end="54">KLZ – your partner for successful wind farm cabling</h3>
<p data-start="56" data-end="443">Whether you need <a href="/de/stromkabel/mittelspannungskabel/"><strong data-start="59" data-end="77">medium voltage</strong></a>, <strong data-start="79" data-end="91">underground cables</strong>, or complete <strong data-start="107" data-end="132">grid connection solutions</strong> – we don’t just provide the right materials, but the kind of experience that actually moves your project forward. For years, we’ve been supporting <strong data-start="278" data-end="299">wind power projects</strong> throughout Germany and the Netherlands – from technical consulting and <strong data-start="381" data-end="400">material selection</strong> to <strong data-start="413" data-end="440">on-time delivery</strong>.</p>
<p data-start="445" data-end="798">Our advantage? <strong data-start="472" data-end="486">Real-world experience</strong>: We know how tight construction timelines in wind projects are, which cable systems have proven themselves, and what really matters in logistics. Thanks to our <strong data-start="640" data-end="686">central storage facilities in Germany</strong>, we respond quickly to changes and keep supply chains stable – even when your project gets dynamic.</p>
<p data-start="800" data-end="984">With our network, market knowledge, and passion for renewable energy, we ensure your <strong data-start="921" data-end="941">wind power project</strong> connects to the grid on time – and without the drama.</p>
<p data-start="986" data-end="1198">➡️ <strong data-start="989" data-end="1080">Planning a new wind farm or need help choosing the right cables?</strong> Then talk to us – we deliver the <strong data-start="1126" data-end="1159">cables, solutions, and expertise</strong> that make your project a success.</p>
<p data-start="1200" data-end="1260"><a href="/de/kontakt/">Get in touch now</a></p>
