import { redirect } from 'next/navigation';

export const dynamic = 'force-dynamic';

export default function SponsorPage() {
  // Redirect to dashboard - this will be handled by middleware for auth
  // Using permanent redirect to avoid cookie loss
  redirect('/sponsor/dashboard');
}