import { ImageResponse } from 'next/og';
import { getTranslations } from 'next-intl/server';
import { OGImageTemplate } from '@/components/OGImageTemplate';
import { getOgFonts, getOgBackground, getOgLogo, OG_IMAGE_SIZE } from '@/lib/og-helper';

export const size = OG_IMAGE_SIZE;
export const contentType = 'image/png';
export const runtime = 'nodejs';

export default async function Image({ params }: { params: Promise<{ locale: string }> }) {
  const { locale } = await params;
  const t = await getTranslations({ locale, namespace: 'Index.meta' });
  
  let pageTitle = t('title');
  if (pageTitle.startsWith('E-TIB GmbH | ')) {
    pageTitle = pageTitle.substring('E-TIB GmbH | '.length);
  }

  const fonts = await getOgFonts();
  const bg = getOgBackground();
  const logo = getOgLogo();

  return new ImageResponse(
    <OGImageTemplate
      title="Die Experten für Kabelnetzbau"
      description={pageTitle}
      label="Kabelnetzbau & Infrastruktur"
      image={bg}
      logo={logo}
    />,
    {
      ...OG_IMAGE_SIZE,
      fonts,
    },
  );
}
