---
title: "Grid Expansion Commercial Area Ketzin"
client: "E.DIS Netz GmbH"
date: "2025-06-01"
dateString: "01/2025 to 06/2025"
location: "14669 Ketzin"
featuredImage: "/assets/photos/Etib_E-tib_Tiefbau_Guben_Netzanbindung_Energie-14.jpg"
---

- Excavation and backfilling of 1,600 m cable trench
- 7,500 m HDD directional drilling d 180
- 11,200 m laying of MV cable 240 mm², 12/20 kV
- 11,200 m laying of PE protective pipe 50 x 4.6 mm
- All medium voltage assembly works
- VLF testing
