---
title: "About E-TIB - Your Partner for Infrastructure Networks"
date: "2024-03-20"
excerpt: "The E-TIB Group is your competent partner for cable civil engineering, drilling technology, and engineering services."
layout: "fullBleed"
---

<HomeHero 
  badge="The E-TIB Group"
  title="Reliability has a Tradition"
  description="Since 2015, we have been growing continuously to meet the demands of the energy transition and digitalization. As a corporate group, we pool specialized expertise under one roof."
  videoUrl="/assets/videos/web/hero-bahnkreuzung.mp4"
  linkText="Open Positions"
  linkHref="/en/career"
  secondaryCtaLabel="Discover Company"
  secondaryCtaHref="#structure"
/>

<div className="bg-neutral-50 py-24 border-b border-neutral-100">
  <div className="container max-w-6xl mx-auto px-4">
    <div className="grid grid-cols-1 lg:grid-cols-2 gap-16 items-center">
      <div>
        <div className="text-primary font-bold tracking-wider uppercase text-sm mb-4">Our Mission</div>
        <div className="font-heading text-4xl md:text-5xl font-extrabold text-neutral-dark mb-8 leading-tight">Infrastructure for the Energy of Tomorrow</div>
        <div className="w-20 h-2 bg-primary mb-8"></div>
        <div>
          Since our foundation in 2015 in Guben, we have made it our mission to actively shape the expansion of critical infrastructure.
        </div>
        <div>
          With over 100 experts for your project (including specialists from E-TIB GmbH, E-TIB Bohrtechnik and E-TIB Ingenieurgesellschaft) and a state-of-the-art machinery park, we master even the most demanding projects in cable network construction, directional drilling, and grid assembly. Reliability, adherence to schedules, and the highest quality standards are our foundation.
        </div>
      </div>
      <div className="grid grid-cols-2 gap-6">
        <div className="bg-white p-8 rounded-2xl shadow-sm border border-neutral-100">
          <div className="text-4xl font-extrabold text-primary mb-2">100+</div>
          <div className="text-neutral-dark font-semibold">Employees</div>
        </div>
        <div className="bg-white p-8 rounded-2xl shadow-sm border border-neutral-100">
          <div className="text-4xl font-extrabold text-primary mb-2">2015</div>
          <div className="text-neutral-dark font-semibold">Founded</div>
        </div>
        <div className="bg-white p-8 rounded-2xl shadow-sm border border-neutral-100">
          <div className="text-4xl font-extrabold text-primary mb-2">110kV</div>
          <div className="text-neutral-dark font-semibold">Max. Voltage</div>
        </div>
        <div className="bg-white p-8 rounded-2xl shadow-sm border border-neutral-100">
          <div className="text-4xl font-extrabold text-primary mb-2">100%</div>
          <div className="text-neutral-dark font-semibold">Dedication</div>
        </div>
      </div>
    </div>
  </div>
</div>

<div className="bg-[#050B14] py-24 md:py-32 text-white relative overflow-hidden group my-16 md:my-24 rounded-[2.5rem] md:rounded-[3.5rem] mx-4 md:mx-auto max-w-7xl">
  <div className="absolute inset-0 bg-[url('/assets/photos/Etib_E-tib_Tiefbau_Guben_Netzanbindung_Energie-54.jpg')] opacity-20 bg-cover bg-center mix-blend-overlay group-hover:scale-105 transition-transform duration-1000"></div>
  <div className="absolute inset-0 bg-gradient-to-br from-[#050B14] via-[#0A1322]/90 to-[#050B14]"></div>
  <div className="container max-w-4xl mx-auto px-4 relative z-10 text-center">
    <div className="mb-8">
      <Badge variant="accent">Nationwide Presence</Badge>
    </div>
    <h2 className="font-heading text-4xl md:text-5xl lg:text-6xl font-extrabold mb-6 leading-tight text-transparent bg-clip-text bg-gradient-to-r from-white to-white/70">Infrastructure for<br />an entire country</h2>
    <p className="text-lg md:text-xl text-white/60 mb-12 max-w-2xl mx-auto leading-relaxed">Since 2016, we have proven in over 200 projects across Germany that we reliably implement infrastructure projects of any scale.</p>
    <Button href="/en/referenzen" variant="primary" size="lg" className="shadow-[0_0_20px_rgba(130,237,32,0.3)]">
      View our references <span className="text-xl leading-none">&rarr;</span>
    </Button>
  </div>
</div>

<CompanyTimeline />

<div id="structure">
  <HomeSubCompanyTiles
    badge="Structure"
    title="Pooled Competencies"
    companies={[
      {
        title: "E-TIB GMBH",
        description: "The complete range of services for the construction of cable routes from a single source.",
        icon: "M3 9l9-7 9 7v11a2 2 0 0 1-2 2H5a2 2 0 0 1-2-2z",
        url: "/en/standorte/guben",
        backgroundImage: "/assets/photos/Etib_E-tib_Tiefbau_Guben_Netzanbindung_Energie-54.jpg"
      },
      {
        title: "E-TIB Ingenieurgesellschaft mbH",
        description: "Our engineers plan the energy and telecommunications networks of the future for you - surveying and documentation included.",
        icon: "M19 21V5a2 2 0 00-2-2H7a2 2 0 00-2 2v16m14 0h2m-2 0h-5m-9 0H3m2 0h5M9 7h1m-1 4h1m4-4h1m-1 4h1m-5 10v-5a1 1 0 011-1h2a1 1 0 011 1v5m-4 0h4",
        url: "https://www.etib-ing.com/",
        backgroundImage: "/assets/photos/etib_ingenieure_tiefbau_solar_pv_planung_vermessung_gis-298.jpg"
      },
      {
        title: "E-TIB Verwaltung GmbH",
        description: "Central services, purchasing, finance, and management of real estate, properties, machinery, and equipment.",
        icon: "M19 21V5a2 2 0 00-2-2H7a2 2 0 00-2 2v16m14 0h2m-2 0h-5m-9 0H3m2 0h5M9 7h1m-1 4h1m4-4h1m-1 4h1m-5 10v-5a1 1 0 011-1h2a1 1 0 011 1v5m-4 0h4",
        url: "/en/standorte/buelstedt",
        backgroundImage: "/assets/photos/DJI_0048.JPG"
      },
      {
        title: "E-TIB Bohrtechnik GmbH",
        description: "Precise horizontal directional drilling in all soil classes for surface-friendly and trenchless pipe laying.",
        icon: "M12 3v1m0 16v1m9-9h-1M4 12H3m15.364 6.364l-.707-.707M6.343 6.343l-.707-.707m12.728 0l-.707.707M6.343 17.657l-.707.707M16 12a4 4 0 11-8 0 4 4 0 018 0z",
        url: "/en/bohrtechnik",
        backgroundImage: "/assets/photos/Etib_E-tib_Tiefbau_Guben_Netzanbindung_Energie-47.jpg"
      }
    ]}
  />
</div>



<CallToAction />
