---
title: "About E-TIB"
date: "2024-03-20"
excerpt: "The E-TIB Group is your competent partner for cable civil engineering, drilling technology, and engineering services."
---

# About Us

The **E-TIB Group** stands for the highest quality and reliability in the field of energy and data infrastructure. With our headquarters in Guben and projects throughout Germany, we are a key player in the implementation of the energy transition.

## Our Philosophy

We believe that a stable infrastructure is the foundation for a successful future. That's why we focus on:

- **Precision**: Exact planning and execution are a matter of course for us.
- **Innovation**: We use state-of-the-art technology such as horizontal directional drilling to make projects more efficient.
- **Sustainability**: Our methods are designed to have as little impact on the environment as possible.

## The E-TIB Group

Our strength lies in the pooling of specialized expertise:

### E-TIB GmbH
Focus on the execution of electrical infrastructure projects and classic cable civil engineering.

### E-TIB Bohrtechnik GmbH
Specialists in trenchless installation techniques and controlled horizontal drilling.

### E-TIB Ingenieurgesellschaft mbH
Your partner for planning, project management, and the seamless documentation of complex construction projects.

## Contact Us

Would you like to learn more about our work? We look forward to hearing from you.
