---
title: "Planning and Consulting"
date: "2024-03-20"
excerpt: "Professional planning and consulting in the field of energy and telecommunications networks: route planning, approval procedures and project control from a single source."
layout: "fullBleed"
---

<HeroSection
  badge="Core Competency"
  title="Planning & Consulting"
  subtitle="Competent support for energy and telecommunications networks"
  backgroundImage={{ url: '/assets/photos/etib_ingenieure_tiefbau_solar_pv_planung_vermessung_gis-298.jpg' }}
  alignment="center"
  ctaLabel="Request a project"
  ctaHref="/en/contact"
/>

<div className="container px-4 max-w-7xl mx-auto py-16">
  <blockquote>
    We offer our clients unified, end-to-end project orchestration—from raw feasibility mapping to technical execution and grid connection for utility-scale renewable energy assets.
  </blockquote>

  ## The Foundation of Project Viability

  A rigorous engineering layout is the cornerstone of every successful infrastructure initiative. Many large-scale utility projects encounter critical delays or structural failures simply because the nuances of subterranean logistics and regulatory approvals were underestimated. By bridging the gap between design and physical field operations, we proactively mitigate risk, eliminating friction at critical operational interfaces.

  Whether executing fast-paced broadband fiber rollouts or designing complex grid connections for gigawatt-scale wind and solar farms, precision is mandatory. Our engineering teams perform comprehensive on-site route audits, map potential utility conflicts early, and guarantee all localized regulatory, environmental, and municipal permits are prepared and filed seamlessly.

  ## Elite Engineering & Technical Advisory

  In strategic partnership with **E-TIB Ingenieurgesellschaft mbH**, we guide your development through every single phase of the project lifecycle. From initial corridor scouting and route optimization to obtaining formal municipal approvals and producing final, field-ready execution plans—we provide the strategic oversight and specialized engineering supervision needed to ensure a flawless handover.
</div>

<ServiceDetailGrid
  badge="Engineering Services"
  title="Our Planning Services"
  descriptionParagraphs={[
    "Minimize risks and interfaces. We combine planning know-how with practical civil engineering expertise."
  ]}
  panels={[
    {
      id: "planung",
      title: "Route & Approval Planning",
      icon: "planning",
      fullWidth: false,
      lists: [
        [
          "Structural planning (route optimization)",
          "Approval planning & authority management",
          "Detailed execution planning",
          "Consent planning"
        ]
      ]
    },
    {
      id: "beratung",
      title: "Control & Supervision",
      icon: "planning",
      fullWidth: false,
      lists: [
        [
          "Tendering & awarding (AVA)",
          "Specialist construction supervision",
          "Project review & controlling",
          "Sound feasibility studies"
        ]
      ]
    }
  ]}
/>

<HomeReferencesSlider badge="Case Studies" title="Planning in Practice" description="Successfully planned and accompanied infrastructure projects of our group." />

