---
title: "Cable Civil Engineering"
date: "2024-03-20"
excerpt: "Professional cable civil engineering (high, medium, and low voltage) and cable assembly up to 110 kV. We guarantee maximum safety standards and seamless documentation for your project."
layout: "fullBleed"
---

<HeroSection
  badge="Core Competency"
  title="Cable Civil Engineering"
  subtitle="Complete infrastructure solutions for high, medium, and low voltage networks and cable assembly up to 110 kV"
  backgroundImage={{ url: '/assets/photos/DSC01123.JPG' }}
  alignment="center"
  ctaLabel="Request a project"
  ctaHref="/en/contact"
/>

<div className="container px-4 max-w-7xl mx-auto py-16">
  <blockquote>
    While underground grid construction is expanding rapidly, execution quality varies widely. We counter this with elite craftsmanship, strict safety protocols, and ironclad documentation—ensuring your infrastructure project remains an asset, not a liability.
  </blockquote>

  ## Precision over Compromise: Preventing Infrastructure Failures

  Modern civil engineering is plagued by low-cost contractors who routinely **compromise on safety margins and technical documentation**. The repercussions are severe: catastrophic utility strikes (power, water, gas, telecom), costly project delays, and massive budget overruns. What begins as a low-bid shortcut quickly turns into a financial and legal nightmare.

  ## Everything from a single source

  E-TIB GmbH is fully specialized in cable network construction. Thanks to our many years of experience, we identify problems early on and develop safe and satisfactory solutions for our clients in advance.

  We offer you the complete range of services for the construction of cable routes from a single source - with our own ultra-modern machine park and permanently employed specialist staff. In direct cooperation with our partner office, E-TIB Ingenieurgesellschaft mbH, we can also rule out planning errors early on and master even the most complex documentation requirements confidently.

  <DataGridPulse />
</div>

<ServiceDetailGrid
  badge="Service Spectrum"
  title="Everything for your network"
  descriptionParagraphs={[
    "We offer the highest precision, state-of-the-art machinery, and certified experts for your project."
  ]}
  panels={[
    {
      id: "grabenbau",
      title: "Trench Construction & Laying",
      icon: "energy",
      fullWidth: false,
      lists: [
        [
          "Production of cable and pipe trenches",
          "Cable laying from 0.4 kV to 110 kV",
          "Cable assembly up to 110 kV",
          "Cable plowing works for fast laying"
        ]
      ]
    },
    {
      id: "anlagen",
      title: "Systems & Infrastructure",
      icon: "energy",
      fullWidth: false,
      lists: [
        [
          "Construction of transformer stations",
          "Establishment of complex grounding systems",
          "Erection of street lighting",
          "Certified switching operations"
        ]
      ]
    }
  ]}
/>

<HomeReferencesSlider badge="Case Studies" title="References" description="We have laid hundreds of kilometers of cables. Take a look at our reference projects." />

