---
title: "Cable Connection U30 - T10, Eisenhüttenstadt"
client: "ArcelorMittal Eisenhüttenstadt GmbH"
date: "2019-07-01"
dateString: "07/2019 to 12/2019"
location: "15890 Eisenhüttenstadt"
featuredImage: "/assets/photos/Etib_E-tib_Tiefbau_Guben_Netzanbindung_Energie_Vermessung_(24_von_99)_groß2.jpg"
---

- 2,095 m cable trench excavation and backfilling
- 180 m horizontal directional drilling d 160 + d 50
- 5,700 m delivery and installation of MV cable 240 mm², 18/30 kV
- 3,000 m delivery and installation of PE protection pipe 50 x 4.6 mm
- 3,000 m delivery and blowing in of FO cable, 12 fibers
- 3,000 m delivery and installation of control cable, 0.6/1 kV
- 16 sets delivery and assembly of MV connection joint 240 mm², 18/30 kV
- 1 unit delivery and assembly of FO connection joint, 12 fibers
- 4 sets delivery and assembly of MV T-connectors 240 mm², 18/30 kV
- Main testing / sheath testing / OTDR measurement
