---
title: "Broadband Expansion FTTC, Spreewald Planning Region"
client: "Telekom Deutschland GmbH"
date: "2017-09-01"
dateString: "09/2017 to 01/2018"
location: "Spreewald Planning Region"
featuredImage: "/assets/photos/DSC01129.JPG"
---

- 4,006 m cable trench excavation and backfilling
- 4,006 m installation of PE protection pipe 50 x 4.6 mm
- 13,008 m horizontal directional drilling D 50
- 94,951 m blowing in of cables/pipes (unoccupied)
- 42 units installation of multi-functional cabinets
- Setup of energy connection pillars and electrical systems 230V
- Coordination with utility companies and commissioning of the electrical systems
- Surface and civil engineering work for multi-function enclosures
