---
title: "PV System Feed-in, Görne"
client: "EVH GmbH"
date: "2020-05-01"
dateString: "05/2020 to 07/2020"
location: "14728 Görne"
featuredImage: "/assets/photos/DSC08744.JPG"
---

- 4,215 m cable trench excavation and backfilling
- 1,285 m horizontal directional drilling d 140 + d 50
- 5,500 m installation of MV cable 300 mm², 12/20 kV
- 4,500 m installation of MV cable 300 mm², 12/20 kV by cable plow
- 10,000 m installation of PE protection pipe 50 x 4.6 mm
- 10,000 m blowing in of FO cable, 12 fibers
- 3 units delivery and assembly of FO connection joint, 12 fibers
- 16 sets assembly of MV connection joint 300 mm², 12/20 kV
- 4 sets assembly of MV T-connectors 300 mm², 12/20 kV
- Sheath testing, VLF testing, OTDR measurement
