---
title: "New Cable Route, Forst"
client: "Mitteldeutsche Netzgesellschaft Strom mbH"
date: "2020-03-01"
dateString: "03/2020 to 09/2020"
location: "03149 Forst"
featuredImage: "/assets/photos/DSC02156.jpg"
---

- 2,984 m cable trench excavation and backfilling
- 945 m horizontal directional drilling d 160 + d 50
- 3,929 m installation of MV cable 240 mm², 12/20 kV
- 3,929 m installation of PE protection pipe 50 x 4.6 mm
- 11 sets assembly of MV connection joint 240 mm², 12/20 kV
- 1 set assembly of MV end termination 240 mm², 12/20 kV
- 2,000 m dismantling of overhead line (incl. 16 poles)
