---
title: "Cable Civil Engineering"
date: "2024-03-20"
excerpt: "Professional cable civil engineering for medium and low voltage networks. We guarantee maximum safety standards and seamless documentation for your project."
layout: "fullBleed"
---

<HeroSection
  badge="Core Competency"
  title="Cable Civil Engineering"
  subtitle="Complete infrastructure solutions for medium and low voltage networks"
  backgroundImage={{ url: '/assets/photos/DSC01123.JPG' }}
  alignment="center"
  ctaLabel="Request a project"
  ctaHref="/en/contact"
/>

<div className="container px-4 max-w-7xl mx-auto py-16">
  <blockquote>
    Everywhere digging and drilling is happening, but unfortunately a lot also goes wrong. We focus on quality, the highest safety standards and legally compliant documentation - so that your construction project does not turn into a cost trap.
  </blockquote>

  ## Quality instead of a Cost Trap

  On many construction sites, cheap providers from abroad are increasingly being used, which often leads to **safety standards and documentation requirements being ignored**. The consequences are severe: accidents, damaged external lines (such as electricity, water and gas) as well as massive construction delays and expensive supplements. A supposed bargain quickly turns out to be a financial burden.

  Particularly for funded infrastructure projects, retrieving the funding is extremely problematic without absolutely seamless, standard-compliant documentation.

  ## Everything from a Single Source

  Thanks to our many years of experience, we identify problems early on and work out safe and satisfactory solutions for our clients in advance. E-TIB GmbH has fully specialized in cable civil engineering.

  We offer you the complete range of services for the construction of cable routes from a single source - with our own ultra-modern machine fleet and permanent specialist staff from the region. In direct cooperation with our partner office, E-TIB Ingenieurgesellschaft mbH, we can also rule out planning errors at an early stage and sovereignly meet even the most complex documentation requirements.

  <DataGridPulse />
</div>

<ServiceDetailGrid
  badge="Service Portfolio"
  title="Everything for Your Network"
  descriptionParagraphs={[
    "We offer the highest precision, modern machines and certified experts for every civil engineering project - from cable laying to transformer stations."
  ]}
  panels={[
    {
      id: "grabenbau",
      title: "Trench Construction & Laying",
      icon: "energy",
      fullWidth: false,
      lists: [
        [
          "Production of cable and pipe trenches",
          "Cable laying from 0.4 kV to 110 kV",
          "Cable assembly from 0.4 kV to 30 kV",
          "Cable plowing works for fast laying"
        ]
      ]
    },
    {
      id: "anlagen",
      title: "Systems & Infrastructure",
      icon: "energy",
      fullWidth: false,
      lists: [
        [
          "Construction of transformer stations",
          "Establishment of complex grounding systems",
          "Erection of street lighting",
          "Certified switching operations"
        ]
      ]
    }
  ]}
/>

<HomeReferencesSlider badge="Case Studies" title="Completed Civil Engineering Projects" description="We have laid hundreds of kilometers of cables. Take a look at our reference projects." />

<CallToAction 
  title="Do you have a specific project?" 
  text="We would be happy to advise you on all questions regarding cable civil engineering and line laying."
  buttonText="Contact us"
  buttonLink="/en/contact"
/>
